
 GPS week: 1297   Day: 4   MJD: 53327                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2747      0     0.02     0.03     2.65     0.00      0
 cod |   288     0  25135    556    -0.02     0.25     0.03    21.24      0
 emr |   288     0  22695      2    14.14    -0.90     0.03    21.49      0
 esa |   288     0  15274   1251  3614.59    52.05     0.06     9.57      0
 gfz |   288     0  21082    606    -0.12     0.07     0.04    20.38      0
 iga |    96     0   2669     17    -0.07     0.02     0.06     0.00      0
 igu |    96     0   2679      0    -0.07     0.02     2.71     0.00      0
 jpl |   288     0  17670    291    -4.44    -1.45     0.06    10.96      0
 ngs |    96     0   2679      0    -0.05     0.00     2.39     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  34207   2028    14.11    -0.86     0.04    16.36      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    2 |  1620   -35     -     -     X     -     -    69     -     -     - |
    3 | -4292   -67  -123   139    84   -67  -598   149 -3329     -   -38 |
    4 | -2427   -19    12   118    10    58   168   -31 -2031     -   -53 |
    5 | -4356    -7    -6    75    35    27 -2541   -42 -3735     -   -42 |
    6 |  -166  -110    -5    20    87    22 -6398     X -1041     -    30 |
    7 |  -797     8    12    41   -23    32  1830    37  -699     -   -46 |
    8 | -2986    -2   -14   161    54    42 -3200   -46 -2500     -  -109 |
    9 | -2269   -45    29     0    32    53  -835   -38 -3009     -     6 |
   10 | -4219   162   -50   -42   -53    78  6033    23 -3333     -   -70 |
   11 |  4855    -2   -21    28   -26    42   722   138  4698     -   -46 |
   13 |  4232   130  -193   124    28    29  1077    70  4210     -   -66 |
   14 |  1016   -72     6  -105   -46   -71  -457   162  1103     -    94 |
   15 | -2836  -136    96    16    -8    79   -55   119 -2753     -   -28 |
   16 |  3842   -34  -110    28    61   -92   181   209  3530     -   -44 |
   17 |  1781    63   -58  -131    81    93  5750    54  2180     -   -65 |
   18 |  3145     7   -30  -155    11  -176  1206   130  3218     -    21 |
   19 |  4697     1  -202   -51   115   -35  1613   136  4381     -    59 |
   20 |  4672   -78   -48   -86    72   -45  1937   131  4690     -    38 |
   21 |  3737    50   -31     4   -76   -86  3259   167  3101     -   -44 |
   22 |  -871    38   -59   -81    19  -125   211   164  -845     -   -59 |
   23 | -1589    29  -136   -48     2   -98  -528   140 -1617     -    73 |
   24 |  1035    65    -8   -64    65    98-12166   -45  -378     -   -88 |
   25 | -3529   -87   -61   133   120    36 -1252   -10 -2831     -   -28 |
   26 | -4660     X   -93     X   129    40   259    43 -4099     -   -56 |
   27 | -2679   -33   -85     8   132    83   435   -40 -2026     -    11 |
   28 |  4985   123   -66    -9   -64   -15  7782    83  5433     -   -43 |
   29 | -3571     X   -13     X    36     2 -4200    -3 -3941     -   -22 |
   30 | -2796  -135    42    79    91    62  -739   -21 -2892     -   -26 |
   31 |  4437    74   -70    16   -65   -66   266    51  4083     -    34 |
 -----+-------------------------------------------------------------------+
 ALBH |     -   115   -36     -     -     -     -    -2     -     -  -100 |
 ALRT |     -   -57     -     -    60     -     -     -     -     -     - |
 AMC2 |     -  -114   136     -     -     -     -  -313     -     -   178 |
 AREQ |     -     -    62     -     -     -     -     -     -     -   -82 |
 ARTU |     -    54     -     -   -53     -     -    -6     -     -     X |
 ASPA |     -     -     -     -   105     -     -     -     -     -  -131 |
 BAHR |     -     -   -50     -   113     -     -     -     -     -   -73 |
 BAN2 |     -     -    -7     -     -     -     -     -     -     -     9 |
 BOGT |     -   145     -  -216    81     -     -     -     -     -  -181 |
 BOR1 |     -   -61    67     -     -     -     -  -127     -     -    70 |
 BREW |     -     -    78     -     -     -     -  -213     -     -    41 |
 BRMU |     -     -     -     -    75     -     -     -     -     -   -94 |
 BRUS |     -    -5     9     -     -     -     -     -     -     -    -5 |
 CAGZ |     -   123     -     -     -     -     -     -     -     -  -160 |
 CAS1 |     -     5     -   237  -186     -     -     -     -     -    33 |
 CHAT |     -   -75     -     -    29     -     -     -     -     -    62 |
 CHUR |     -     -    14     -     -     -     -    27     -     -   -36 |
 COCO |     -    31     -  -115   -40     -     -     -     -     -    77 |
 CRO1 |     -    21   225  -104   -42     -     -   -91     -     -  -148 |
 DAV1 |     -    54     -     -   -27     -     -    12     -     -   -44 |
 DGAR |     -   -50     -     -     -     -     -    98     -     -     X |
 DRAO |     -    66   -39     -     -     -     -    46     -     -   -65 |
 DWH1 |     -   216  -133     -     -     -     -     -     -     -  -107 |
 FAIR |     -    35    18    78   -92     -     -     -     -     -     - |
 FORT |     -  -152    34     -   108     -     -     -     -     -     - |
 GLPS |     -    79     -     -   -84     -     -     -     -     -     3 |
 GODE |     -     5    87     -     -     -     -     -     -     -  -121 |
 GOL2 |     -     -     -     -     -     -     -   -78     -     -    52 |
 GOLD |     -     -     -   151   -61     -     -   -14     -     -     X |
 GRAZ |     -     -    40     -     -     -     -     -     -     -   -52 |
 GUAM |     -     -     -     X    85     -     -  -372     -     -   143 |
 GUAT |     -   -66     -     -   -32     -     -     -     -     -   125 |
 HOB2 |     -  -113   116     -     -     -     -     -     -     -    -5 |
 HOFN |     -     -     -     -   -86     -     -     -     -     -   107 |
 IISC |     -     -     -  -169    80     -     -     -     -     -     - |
 ISPA |     -    18     -     -    48     -     -    10     -     -   -89 |
 JPLM |     -     -   -76     -     -     -     -  -100     -     -   167 |
 KELY |     -   130     -     -     -     -     -  -251     -     -     - |
 KGN0 |     -   -33    -5     -     -     -     -     -     -     -    50 |
 KIRU |     -     -     -     -     -     -     -   -48     -     -    32 |
 KIT3 |     -     -     -   -10   -93     -     -    49     -     -    85 |
 KOKB |     -     -   122     -   -88     -     -  -108     -     -    22 |
 KOSG |     -   -18     -     -     -     -     -     -     -     -    24 |
 KOUR |     -   189     -  -343   -29     -     -     -     -     -    14 |
 LPGS |     -  -113   220  -175     -     -     -     -     -     -   -42 |
 MAC1 |     -   -74     -   114  -115     -     -     -     -     -   172 |
 MADR |     -     -     -     -     -     -     -    86     -     -   -58 |
 MAS1 |     -     3    74  -253    14     -     -    80     -     -   -24 |
 MAW1 |     -   183     -     -   -88     -     -     -     -     -  -126 |
 MBAR |     -   -18     -     -   -24     -     -    45     -     -    24 |
 MCM4 |     -   160  -159     -     X     -     -     -     -     -     - |
 MEDI |     -     -    31     -     -     -     -     -     -     -   -41 |
 METS |     -     -    12     -     -     -     -     -     -     -   -16 |
 MIZU |     -     -    -8   -72     -     -     -     -     -     -    47 |
 MKEA |     -     -     -    25     -     -     -   -73     -     -    34 |
 MSKU |     -    17     -     -   -17     -     -     -     -     -     - |
 NKLG |     -     -     -     -    76     -     -     -     -     -   -94 |
 NLIB |     -   -38    42     -     -     -     -   -78     -     -    47 |
 NNOR |     -     -    -4    57     -     -     -  -102     -     -    40 |
 NPLD |     -  -102    69     -     -     -     -     -     -     -    42 |
 NRC1 |     -     -    38     -   -63     -     -     -     -     -    29 |
 NRIL |     -    59     -     -   -69     -     -    15     -     -     X |
 NSSP |     -   -41     -     -     -     -     -     -     -     -    53 |
 NTUS |     -  -129     -     -     -     -     -     -     -     -   167 |
 NYA1 |     -    79     -     -   -78     -     -     -     -     -    -6 |
 OHI2 |     -     -     -     -    26     -     -     -     -     -   -33 |
 ONSA |     -     -    28   -62     -     -     -     -     -     -     - |
 PERT |     -     -     0     4    85     -     -     -     -     -  -108 |
 PIE1 |     -     -   -44  -233     -     -     -     -     -     -   169 |
 PRDS |     -     -   -16     -     -     -     -     -     -     -    21 |
 PTBB |     -   -52    14     -     -     -     -     -     -     -    50 |
 QAQ1 |     -     -   -20     -     -     -     -     -     -     -    26 |
 RIOG |     -   -10    83     -   -86     -     -     -     -     -    12 |
 SANT |     -     -     -     X   -80     -     -     -     -     -    99 |
 SCH2 |     -     -    73     -     -     -     -  -172     -     -    19 |
 SEY1 |     -    35     -     -   -36     -     -     -     -     -     X |
 SFER |     -   -37    36     -     -     -     -     -     -     -     - |
 SPT0 |     -   -52    96     -     -     -     -     -     -     -   -58 |
 STJO |     -     -     0     -     -     -     -     0     -     -     X |
 STR1 |     -     -   -58     -     -     -     -     -     -     -    77 |
 THTI |     -     -   102    29   -82     -     -     -     -     -   -48 |
 THU3 |     -   -64   150     -     -     -     -     -     -     -  -113 |
 TID1 |     -     -     -     -     -     -     -   -74     -     -    50 |
 TIDB |     -   -47   -17   120     -     -     -     -     -     -    13 |
 TLSE |     -     -   -45     -     -     -     -     -     -     -    59 |
 TOW2 |     -   -85     -     -    37     -     -     -     -     -    64 |
 TRO1 |     -    85     -     -  -178     -     -     -     -     -   111 |
 TSKB |     -  -117   -32     -   101     -     -     -     -     -    68 |
 TWTF |     -   -80    -5     -     -     -     -     -     -     -   111 |
 UNSA |     -     -     -   396     -     -     -     -     -     -  -232 |
 URUM |     -   -41     -     -     -     -     -     -     -     -    54 |
 USN3 |     -   -43     -     -     -     -     -   -74     -     -   105 |
 USNO |     -   -63    46     -     -     -     -     -     -     -    22 |
 USUD |     -     -   -40   139     -     -     -   -42     -     -     X |
 WHIT |     -    10     -     -     -     -     -   -90     -     -    47 |
 WILL |     -    34     -     -     -     -     -     -     -     -   -44 |
 WTZR |     -     -     -   -93     -     -     -     -     -     -    55 |
 WUHN |     -     -     -     -    -5     -     -     -     -     -     6 |
 YAR2 |     -    84     -     -     -     -     -     -     -     -  -109 |
 YELL |     -   -63   -48   474  -136     -     -     -     -     -    36 |
 ZIMM |     -     -     -     -     -     -     -   169     -     -  -113 |
 ZWE2 |     -    94     -     -   -98     -     -     -     -     -     - |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    2 |  1239    69     -     -     X     -     -   133     -     -     - |  209   0.66
    3 |  3774    47    42    77    34    48  2244    59  3950     -    52 |  288   2.20
    4 |  1049    44    52    76    28    33   631    31   699     -    74 |  288   0.88
    5 |  2420    18    18    69    20    38  1728    99  2207     -    48 |  288   2.36
    6 |  3848    42    23    68    11    31  5621     X  3523     -    41 |  288   1.85
    7 |  1714    44    65    96    42    70  1694    58  1622     -    30 |  288   0.88
    8 |  4372    43    15    45    21    39  3205    42  3915     -    63 |  288   2.82
    9 |  4626    44    37    70    26    42  2656    67  3963     -    88 |  288   2.34
   10 |  4725    32    31    57    33    39  5265    71  4597     -    50 |  288   3.39
   11 |   812    46    36    39    32    67   452    21   634     -    49 |  288   0.32
   13 |   431    67    38   101    40    62   794    57   486     -    54 |  288   0.28
   14 |  1534    66    48    35    32    54   844    35  1542     -    73 |  288   0.25
   15 |  4287    41    25    42    38    41  2530    38  3616     -    52 |  288   2.30
   16 |  1454    27    52    28    36    45   360    92  1350     -    43 |  288   0.41
   17 |  2487    37    24    67    27    59  4304    66  2253     -    81 |  288   1.24
   18 |   912    34    34    35    17    63   433    50   901     -    69 |  288   0.37
   19 |  1376    62    69    46    39    45   381   109  1130     -    54 |  288   0.34
   20 |   479    40    37    70    27    55   483    46   487     -    36 |  288   0.20
   21 |  2516    50    28    32    22    39   813    74  2308     -    43 |  288   0.28
   22 |   529    28    23    99    40    35   228    73   559     -    34 |  288   0.26
   23 |   616    60    38    56    43   111   764    53   623     -   100 |  288   0.36
   24 |  5006    52    28    62    21    38  7132    76  3213     -    58 |  288   2.41
   25 |  2962    49    37    35    15    46  2318    52  3047     -    39 |  288   2.09
   26 |  1021     X    39     X    91   101   688    95  1342     -    63 |  276   0.90
   27 |  1641    54    14    65    36    46   825    46  1103     -    94 |  288   0.74
   28 |  3374    31    81    73    48    72  4220    64  3148     -    43 |  288   0.50
   29 |  2283     X    52     X    98    99  2512    63  2058     -    54 |  272   0.69
   30 |  1688    19    17    48    20    19  1619   119  1456     -    74 |  288   0.89
   31 |  1838    52    67   131    31    62  2630    35  1862     -    37 |  288   2.18
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    39    29     -     -     -     -    16     -     -    30 |  288   0.05
 ALRT |     -    23     -     -    24     -     -     -     -     -     - |  288   5.90
 AMC2 |     -    38    33     -     -     -     -    22     -     -    19 |  288   0.03
 AREQ |     -     -    22     -     -     -     -     -     -     -    29 |  284  11.86
 ARTU |     -    17     -     -    17     -     -    35     -     -     X |  288   9.98
 ASPA |     -     -     -     -    25     -     -     -     -     -    31 |  288    >>>
 BAHR |     -     -    24     -    19     -     -     -     -     -    36 |  288   0.64
 BAN2 |     -     -    26     -     -     -     -     -     -     -    34 |  282  16.05
 BOGT |     -    43     -   121    45     -     -     -     -     -    51 |  288  20.23
 BOR1 |     -    37    57     -     -     -     -    75     -     -    18 |  288   1.24
 BREW |     -     -    24     -     -     -     -    26     -     -    21 |  288   0.08
 BRMU |     -     -     -     -    14     -     -     -     -     -    17 |  288    >>>
 BRUS |     -    34    19     -     -     -     -     -     -     -    41 |  288   0.03
 CAGZ |     -    16     -     -     -     -     -     -     -     -    20 |  288    >>>
 CAS1 |     -    24     -    30    25     -     -     -     -     -    30 |  288   7.89
 CHAT |     -    38     -     -    26     -     -     -     -     -    40 |  287  10.30
 CHUR |     -     -    13     -     -     -     -    13     -     -    17 |  288   0.39
 COCO |     -    23     -    50    27     -     -     -     -     -    27 |  288   9.72
 CRO1 |     -    30    24    48    44     -     -    35     -     -    39 |  288  12.81
 DAV1 |     -    26     -     -    47     -     -    37     -     -    36 |  288  14.26
 DGAR |     -    18     -     -     -     -     -    36     -     -     X |  288  16.59
 DRAO |     -    22    19     -     -     -     -    16     -     -    30 |  288   0.10
 DWH1 |     -    29    30     -     -     -     -     -     -     -    21 |  288   0.50
 FAIR |     -    28    24    58    17     -     -     -     -     -     - |  288   0.57
 FORT |     -    23    28     -    25     -     -     -     -     -     - |  288   0.11
 GLPS |     -    20     -     -    21     -     -     -     -     -    29 |  288  21.68
 GODE |     -    18    17     -     -     -     -     -     -     -    19 |  288   0.10
 GOL2 |     -     -     -     -     -     -     -    45     -     -    30 |  266 376.44
 GOLD |     -     -     -    34    14     -     -    12     -     -     X |  288  11.25
 GRAZ |     -     -    10     -     -     -     -     -     -     -    14 |  288    >>>
 GUAM |     -     -     -     X    39     -     -    45     -     -    59 |  288  19.15
 GUAT |     -    38     -     -    35     -     -     -     -     -    29 |  288    >>>
 HOB2 |     -    21    17     -     -     -     -     -     -     -    28 |  288   0.08
 HOFN |     -     -     -     -    10     -     -     -     -     -    12 |  287    >>>
 IISC |     -     -     -    45    21     -     -     -     -     -     - |  288  24.93
 ISPA |     -    26     -     -    26     -     -   111     -     -    39 |  288  13.81
 JPLM |     -     -    24     -     -     -     -    40     -     -    17 |  288  10.12
 KELY |     -    13     -     -     -     -     -    25     -     -     - |  287   9.39
 KGN0 |     -    20    32     -     -     -     -     -     -     -    22 |  287   0.25
 KIRU |     -     -     -     -     -     -     -    47     -     -    32 |  275    >>>
 KIT3 |     -     -     -   102    68     -     -    64     -     -    24 |  283  45.65
 KOKB |     -     -    15     -    20     -     -    34     -     -    20 |  288   0.06
 KOSG |     -    26     -     -     -     -     -     -     -     -    34 |  288  79.17
 KOUR |     -    47     -    46    40     -     -     -     -     -    47 |  288   1.45
 LPGS |     -    28    22    44     -     -     -     -     -     -    44 |  288  30.76
 MAC1 |     -    41     -    39    40     -     -     -     -     -    31 |  288  19.11
 MADR |     -     -     -     -     -     -     -    27     -     -    18 |  288  13.10
 MAS1 |     -    25    41    57    18     -     -    50     -     -    32 |  287   2.06
 MAW1 |     -    22     -     -    19     -     -     -     -     -    35 |  283  16.85
 MBAR |     -    24     -     -    73     -     -    98     -     -   121 |  288  16.80
 MCM4 |     -    21    21     -     X     -     -     -     -     -     - |  286  13.77
 MEDI |     -     -    13     -     -     -     -     -     -     -    18 |  288   0.06
 METS |     -     -    14     -     -     -     -     -     -     -    19 |  287  10.01
 MIZU |     -     -    22    63     -     -     -     -     -     -    31 |  288   0.62
 MKEA |     -     -     -    43     -     -     -    48     -     -    43 |  288  24.03
 MSKU |     -    31     -     -    33     -     -     -     -     -     - |  288  19.76
 NKLG |     -     -     -     -    65     -     -     -     -     -    81 |  278    >>>
 NLIB |     -    23    47     -     -     -     -    19     -     -    54 |  288   0.03
 NNOR |     -     -    17    44     -     -     -    39     -     -    39 |  288  18.53
 NPLD |     -    24    40     -     -     -     -     -     -     -    27 |  287   0.04
 NRC1 |     -     -    14     -    19     -     -     -     -     -    14 |  288   0.01
 NRIL |     -    21     -     -    18     -     -    30     -     -     X |  288   8.26
 NSSP |     -    26     -     -     -     -     -     -     -     -    33 |  288   9.34
 NTUS |     -    21     -     -     -     -     -     -     -     -    27 |  287   7.93
 NYA1 |     -    20     -     -    10     -     -     -     -     -    24 |  288   0.06
 OHI2 |     -     -     -     -    74     -     -     -     -     -    93 |  288   8.83
 ONSA |     -     -    23    52     -     -     -     -     -     -     - |  283   0.04
 PERT |     -     -    27    41    20     -     -     -     -     -    33 |  288  10.18
 PIE1 |     -     -    47    66     -     -     -     -     -     -    60 |  285   1.34
 PRDS |     -     -    16     -     -     -     -     -     -     -    21 |  288   2.23
 PTBB |     -    17    24     -     -     -     -     -     -     -    24 |  288   0.33
 QAQ1 |     -     -    17     -     -     -     -     -     -     -    23 |  288   7.46
 RIOG |     -    26    25     -    32     -     -     -     -     -    46 |  288  12.58
 SANT |     -     -     -     X    16     -     -     -     -     -    20 |  241   9.62
 SCH2 |     -     -    11     -     -     -     -    13     -     -    13 |  288   3.53
 SEY1 |     -    23     -     -    24     -     -     -     -     -     X |  284  17.37
 SFER |     -    21    21     -     -     -     -     -     -     -     - |  287   0.48
 SPT0 |     -    44    82     -     -     -     -     -     -     -    57 |  288   0.09
 STJO |     -     -    11     -     -     -     -    21     -     -     X |  288   0.11
 STR1 |     -     -    18     -     -     -     -     -     -     -    23 |  288   0.93
 THTI |     -     -    21    48    22     -     -     -     -     -    18 |  288   8.78
 THU3 |     -    19    15     -     -     -     -     -     -     -    23 |  288   6.71
 TID1 |     -     -     -     -     -     -     -    48     -     -    32 |  288   0.07
 TIDB |     -    20    26    52     -     -     -     -     -     -    33 |  288   0.08
 TLSE |     -     -    50     -     -     -     -     -     -     -    66 |  287   0.60
 TOW2 |     -    27     -     -    36     -     -     -     -     -    27 |  288   8.38
 TRO1 |     -    30     -     -    18     -     -     -     -     -    33 |  288   8.05
 TSKB |     -    28    25     -    30     -     -     -     -     -    48 |  288   1.23
 TWTF |     -    19    30     -     -     -     -     -     -     -    29 |  288   0.81
 UNSA |     -     -     -    21     -     -     -     -     -     -    12 |  105   7.91
 URUM |     -    21     -     -     -     -     -     -     -     -    27 |  288  23.57
 USN3 |     -    19     -     -     -     -     -    17     -     -    18 |  288   0.03
 USNO |     -    39    15     -     -     -     -     -     -     -    35 |  288   0.03
 USUD |     -     -    34    55     -     -     -    65     -     -     X |  288   8.92
 WHIT |     -    31     -     -     -     -     -    22     -     -    30 |  288   0.86
 WILL |     -    21     -     -     -     -     -     -     -     -    28 |  288  53.20
 WTZR |     -     -     -    36     -     -     -     -     -     -    21 |  288   0.04
 WUHN |     -     -     -     -    15     -     -     -     -     -    19 |  287  18.64
 YAR2 |     -    25     -     -     -     -     -     -     -     -    32 |  288 119.11
 YELL |     -    28    17    66     9     -     -     -     -     -    16 |  288   0.02
 ZIMM |     -     -     -     -     -     -     -    35     -     -    24 |  276    >>>
 ZWE2 |     -    14     -     -    15     -     -     -     -     -     - |  288  11.79
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2648    34    34    62    35    57  2710    57  2394     -    43 |


 BEST CLOCK FIT: NRC1   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 NLIB |   288     0     0   288    9.96   | 5.42e-14  8.51e-15  2.03e-15 |
 BRUS |   288     0     0   288    9.95   | 4.19e-14  7.22e-15  1.59e-15 |
 AMC2 |   288     0     0   288    9.95   | 3.51e-14  6.41e-15  1.41e-15 |
 NPLD |   287     0     0   286    9.88   | 3.55e-14  1.10e-14  1.98e-15 |
 ONSA |   283     0     0   282    6.35   | 5.23e-14  9.80e-15  4.13e-15 |
 BREW |   288     0     0   288    6.13   | 4.08e-14  7.52e-15  4.79e-15 |
 TID1 |   288     0     0   288    6.01   | 5.87e-14  1.64e-14  4.56e-15 |
 WTZR |   288     0     0   288    5.60   | 6.35e-14  1.53e-14  4.06e-15 |
 USNO |   288     0     0   288    4.81   | 3.45e-14  1.09e-14  2.52e-15 |
 ALBH |   288     0     0   288    3.78   | 4.25e-14  1.47e-14  3.73e-15 |
 NYA1 |   288     0     0   288    3.53   | 2.71e-14  6.08e-15  5.73e-15 |
 YELL |   288     0     0   288    3.02   | 2.83e-14  6.08e-15  2.49e-15 |
 USN3 |   288     0     0   288    2.98   | 7.83e-14  1.17e-14  2.59e-15 |
 KOKB |   288     0     0   288    2.71   | 4.76e-14  1.44e-14  3.81e-15 |
 DRAO |   288     0     0   288    2.49   | 6.44e-14  2.14e-14  7.14e-15 |
 HOB2 |   288     1     0   287    2.22   | 4.63e-14  1.52e-14  7.08e-15 |
 NRC1 |   288     0     0   276    2.21   | 3.31e-14  1.09e-14  2.94e-15 |
 SPT0 |   288     0     0   143    2.19   | 4.33e-14  1.06e-14  7.28e-15 |
 TIDB |   288     0     0   288    1.40   | 1.95e-13  2.56e-14  5.69e-15 |
 PIE1 |   285     2     0   282    0.85   | 6.28e-14  1.23e-14  6.26e-15 |
 FORT |   288     0     0   288    0.69   | 8.29e-14  1.61e-14  1.19e-14 |
 GOL2 |   266     1     0   116    0.59   | 4.30e-14  1.44e-14  4.33e-15 |
 GODE |   288     0     0   288    0.42   | 3.65e-14  1.09e-14  8.91e-15 |
 MEDI |   288     0     0   288    0.33   | 4.92e-14  8.11e-15  3.96e-15 |
 CHUR |   288     0     0   288    0.32   | 4.78e-14  1.24e-14  2.33e-14 |
 G16  |   288     0     0   288    0.13   | 5.10e-13  6.55e-14  5.05e-14 |
 KGN0 |   287     0     0   286    0.13   | 4.09e-13  9.75e-14  2.44e-14 |
 G23  |   288     0     0   229    0.13   | 5.00e-13  9.35e-14  4.32e-14 |
 MIZU |   288     0     0   288    0.13   | 3.68e-13  9.77e-14  4.96e-14 |
 G30  |   288     0     0   288    0.11   | 3.74e-13  9.59e-14  7.62e-14 |
 G13  |   288     0     0   169    0.10   | 5.49e-13  7.06e-14  2.12e-14 |
 PTBB |   288     0     0   143    0.09   | 3.50e-13  8.37e-14  2.83e-14 |
 G19  |   288     0     4   110    0.07   | 6.90e-13  7.93e-14  3.76e-14 |
 TWTF |   288     0     0   288    0.07   | 4.04e-13  1.39e-13  1.01e-13 |
 BOR1 |   288     1     0   287    0.06   | 4.62e-13  1.18e-13  7.26e-14 |
 SFER |   287     0     0   286    0.06   | 3.33e-13  1.33e-13  4.39e-14 |
 FAIR |   288     0     0   288    0.06   | 2.99e-13  9.34e-14  6.08e-14 |
 G29  |   272     0     0   266    0.05   | 4.20e-13  1.24e-13  8.44e-14 |
 G07  |   288     0     0   288    0.05   | 3.02e-13  8.82e-14  1.08e-13 |
 DWH1 |   288     0     0   288    0.05   | 5.37e-13  1.23e-13  2.44e-14 |
 G02  |   209     0     0   206    0.05   | 5.57e-13  9.81e-14         - |
 G26  |   276     0     0   274    0.05   | 3.53e-13  1.18e-13  9.21e-14 |
 G04  |   288     0     0   288    0.04   | 4.53e-13  1.39e-13  1.17e-13 |
 G27  |   288     0     0   288    0.04   | 3.46e-13  1.12e-13  8.84e-14 |
 BAHR |   288     0     3   105    0.02   | 6.28e-13  1.37e-13  5.99e-14 |
 G31  |   288     0     0   288    0.02   | 2.04e-13  1.67e-13  1.31e-13 |
 TLSE |   287     0     0   142    0.02   | 4.44e-13  1.19e-13  4.77e-14 |
 G17  |   288     0     0   288    0.02   | 8.61e-13  2.22e-13  1.37e-13 |
 G06  |   288     0     0   288    0.02   | 5.58e-13  2.01e-13  1.01e-13 |
 STR1 |   288     0     0   143    0.02   | 6.82e-13  1.92e-13  8.18e-14 |
 PRDS |   288     0     0   288    0.01   | 1.43e-12  3.83e-13  1.93e-13 |
 TSKB |   288     0     0   143    0.01   | 1.02e-12  2.79e-13  1.32e-13 |
 KOUR |   288     0     0   288    0.01   | 1.54e-12  3.73e-13  1.60e-13 |
 WHIT |   288     0     0   288    0.01   | 5.48e-13  1.82e-13  7.59e-14 |
 G03  |   288     0     0   288    0.01   | 1.28e-12  4.57e-13  1.94e-13 |
 MAS1 |   287     0     0   286    0.01   | 2.04e-12  5.29e-13  2.33e-13 |
 G25  |   288     0     0   153    0.00   | 1.46e-12  4.65e-13  2.28e-13 |
 GPST |   288     0     0     0    0.00   | 2.31e-14  7.64e-15  1.88e-15 |
 UNSA |   105     0     0     0    0.00   |        -         -         - |
 MAW1 |   283     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 SANT |   241     0     0     0    0.00   |        -         -         - |
 NKLG |   278     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.53e-13  6.75e-14  3.81e-14 |
 G24  |   288     0     0     0    0.00   | 1.26e-12  5.07e-13  2.08e-13 |
 G22  |   288     0     6     0    0.00   | 6.90e-13  6.32e-14  2.34e-14 |
 G21  |   288     0     6     0    0.00   | 8.11e-13  1.05e-13  2.56e-14 |
 G20  |   288     0     6     0    0.00   | 6.55e-13  6.78e-14  1.91e-14 |
 G18  |   288     0     6     0    0.00   | 1.11e-12  1.09e-13  4.02e-14 |
 G15  |   288     0     0     0    0.00   | 1.50e-12  5.11e-13  2.12e-13 |
 G14  |   288     0     6     0    0.00   | 5.93e-13  6.23e-14  2.77e-14 |
 G11  |   288     0     6     0    0.00   | 6.62e-13  6.75e-14  4.07e-14 |
 G10  |   288     0     0     0    0.00   | 1.25e-12  4.25e-13  3.97e-13 |
 G09  |   288     0     0     0    0.00   | 1.42e-12  6.00e-13  2.53e-13 |
 G08  |   288     0     0     0    0.00   | 1.25e-12  3.75e-13  3.62e-13 |
 G05  |   288     0     0     0    0.00   | 1.40e-12  3.81e-13  2.93e-13 |
 ZWE2 |   288     0     0     0    0.00   |        -         -         - |
 ZIMM |   276     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     2     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     2     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.84e-13  2.37e-13  6.73e-13 |
 STJO |   288     0     0     0    0.00   | 3.44e-14  6.11e-15  8.41e-15 |
 SEY1 |   284     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   | 6.65e-13  2.07e-13  2.26e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   287     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   286     0     0     0    0.00   | 7.12e-13  2.39e-13  8.97e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   283     2     0     0    0.00   |        -         -         - |
 KIRU |   275     0     0     0    0.00   |        -         -         - |
 KELY |   287     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.63e-13  3.65e-13  1.10e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 CAGZ |   288     2     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   282     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   284     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.55e-17  1.86e-16  1.11e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      NYA1      AMC2 |
------------------------------------------+------------------------------+
