
 GPS week: 1297   Day: 2   MJD: 53325                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2782      0     0.01    -0.06     2.98     0.00      0
 cod |   288     0  25260     52    -0.07     0.30     0.05    13.79      0
 emr |   288     0  22476      0   337.32    44.20     0.03    21.31      0
 esa |   288     0  18447   1158   336.57    44.19     0.06    11.42      0
 gfz |   288     0  20317    568    -0.10     0.33     0.03    23.80      0
 iga |    96     0   2688      4     0.00    -0.02     0.07     0.00      0
 igu |    96     0   2782      0     0.00     0.00     2.65     0.00      0
 jpl |   288     0  17492     78    -3.89    -0.48     0.05    13.54      0
 ngs |    96     0   2782      0     0.00    -0.02     2.51     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  33904   1817   337.29    44.26     0.04    16.14      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -7606   -60     8   136   -29    -6 -2861    19 -4867     -   -23 |
    3 |   125    -8  -187   -13   136    12  1600    79  -387     -    -3 |
    4 |  2210   -12   -23   164  -111  -217  3386   136  1768     -    29 |
    5 |  2878   -36    17   341   -87    48 -2755   -13  1488     -   -94 |
    6 |  2049  -113   -16   294  -135   -15 -4537    36  1246     -    79 |
    7 |  -150    52   109  -411    39    55 -1760   113  -305     -   -50 |
    8 |   -56   -39   -39    44   145   -28  8426  -108 -1046     -   -69 |
    9 |   823   -39   -17   -21   102   -78 -1932  -115   -32     -    17 |
   10 | -2568   151    65  -285  -102    60  2229   144 -2224     -    16 |
   11 |  8134    24   -84   -85    58    21  4424   161  6792     -   -70 |
   13 |  3922    83  -142   128    35   -30   753    92  3827     -   -94 |
   14 |  1802  -134    -1    67   -54   -77  2502   103  2273     -    58 |
   15 | -4536   -42    86   -27   -25   155 -1905    46 -4110     -   -60 |
   16 |  4047  -109  -159    19    73   -43  1634   209  4103     -     7 |
   17 |  -175    87    44    65  -151   152  5642    50  -599     -     1 |
   18 |  3373    20   -48    15    40    55  1724   -14  3601     -   -11 |
   19 |  4175   -37  -196   268   105    89  4397    16  4187     -   -62 |
   20 |  5694   -46  -101   -72    97   -59  2483    94  5517     -     3 |
   21 |   329   109    28  -100  -108   122   709   190  1081     -   -60 |
   22 | -3759    79   -15  -183    41     1   696   125 -2884     -   -84 |
   23 | -2056   -13  -186   256    29    14   186    75 -2007     -   -28 |
   24 | -6065   142     6   -35   -98   -22 -8888    33 -5266     -    13 |
   25 | -2945  -120   -48   207    -1  -105 -7966   -13 -2778     -    32 |
   26 | -2289    45   -14   -86    15   -35  2606    -8 -2017     -    15 |
   27 | -2572   -54   -76    13   205   -59  -236  -131 -2920     -   -55 |
   28 |  2326    38  -139    11    77    29 -1624   143  2347     -   -88 |
   29 | -1463    -9    94     X    25     -  -151  -112 -1495     -   -63 |
   30 | -2144   -93   -23   252   -54   -75 -3049    17 -2544     -    -4 |
   31 | -3539     8     5  -145    57    32 -5741    53 -2798     -   -40 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    15     6     -     -     -     -    -1     -     -   -20 |
 ALGO |     -     -  -143   660     -     -     -  -105     -     -  -190 |
 ALRT |     -   -53     -     -    31     -     -     -     -     -     - |
 AMC2 |     -   -11    91     -     -     -     -  -279     -     -   124 |
 ARTU |     -     -     -    77   -49     -     -    21     -     -     X |
 AUCK |     -     -     -   146     -     -     -     -     -     -  -103 |
 BAHR |     -     -   -16     -    49     -     -     -     -     -   -51 |
 BILI |     -   102     -     -   -59     -     -     -     -     -     X |
 BOGT |     -     -     -  -239    76     -     -     -     -     -    57 |
 BOR1 |     -   -23     4     -     -     -     -     -     -     -    14 |
 BREW |     -     -    13     -     -     -     -   -93     -     -    60 |
 BRMU |     -     -     -     -    77     -     -     -     -     -  -114 |
 BRUS |     -    -9    26     -     -     -     -     -     -     -   -26 |
 CAS1 |     -   -59     -    19   -31     -     -     -     -     -    82 |
 CHAT |     -    22     -     -   -42     -     -     -     -     -    42 |
 COCO |     -    64     -  -113   -82     -     -     -     -     -   146 |
 CRO1 |     -     -   282  -135   -99     -     -   -70     -     -   -71 |
 DAEJ |     -   127   -82     -     -     -     -     -     -     -     - |
 DAV1 |     -    56     -     -   -61     -     -    63     -     -   -10 |
 DGAR |     -   -86     -     -     -     -     -    27     -     -    51 |
 DRAO |     -   145   -25     -     -     -     -   -26     -     -   -69 |
 DWH1 |     -   164   -59     -     -     -     -     -     -     -   -62 |
 FAIR |     -     -     -  -215   103     -     -     -     -     -     - |
 FLIN |     -    49     -     -     -     -     -   -50     -     -     - |
 FORT |     -     -  -137   -73   156     -     -     -     -     -     - |
 GLPS |     -    67     -     -  -112     -     -     -     -     -   108 |
 GODE |     -    71   246  -310     -     -     -  -127     -     -   -60 |
 GOL2 |     -     -    -7     -     -     -     -     -     -     -     9 |
 GOLD |     -     -     -     5   -49     -     -    -9     -     -    76 |
 GRAZ |     -     -     8     -     -     -     -     -     -     -   -11 |
 GUAM |     -    10     -  -586   190     -     -  -340     -     -   401 |
 GUAT |     -     -     -     -   -25     -     -     -     -     -    37 |
 HERS |     -     -  -237     -     -     -     -     -     -     -   314 |
 HOB2 |     -  -150   176     -     -     -     -     -     -     -  -104 |
 HOFN |     -     -     -     -  -102     -     -     -     -     -   151 |
 HRAO |     -     -     -     -     -     -     -   -22     -     -    18 |
 IENG |     -  -115    74     -     -     -     -     -     -     -     - |
 IISC |     -    93     -   -55   -27     -     -     -     -     -     - |
 INVK |     -    25     -     -     -     -     -   -26     -     -     X |
 ISPA |     -     3     -     -    36     -     -    -1     -     -   -55 |
 JPLM |     -     -   -88     -     -     -     -    35     -     -    87 |
 KERG |     -   -98     5     X    83     -     -     -     -     -   -46 |
 KGN0 |     -  -101    38     -     -     -     -     -     -     -    36 |
 KIRU |     -   -36     -     -     -     -     -   -41     -     -    65 |
 KIT3 |     -     -     -    13   -27     -     -   -55     -     -    76 |
 KOKB |     -     -    59     -     8     -     -  -181     -     -    63 |
 KOUR |     -   127     -  -286   -70     -     -     -     -     -   153 |
 LPGS |     -  -198   100   115     -     -     -     -     -     -   -33 |
 MAC1 |     -   -57     -   116   -73     -     -     -     -     -    75 |
 MADR |     -     -     -     -     -     -     -    -9     -     -     8 |
 MAS1 |     -     -     -  -534     -     -     -   227     -     -   185 |
 MATE |     -   -16     -     -     -     -     -     -     -     -    13 |
 MBAR |     -   -87     -     -   -86     -     -     4     -     -   205 |
 MCM4 |     -   203  -131     -     X     -     -     -     -     -     - |
 MEDI |     -     -    39     -     -     -     -     -     -     -   -52 |
 MIZU |     -     -   -31   213     -     -     -     -     -     -  -108 |
 MKEA |     -     -     -   -28     -     -     -    16     -     -     7 |
 NKLG |     -     -     -   -14     -     -     -     -     -     -    10 |
 NNOR |     -     -   -44   113     -     -     -     0     -     -   -21 |
 NPLD |     -  -166    89     -     -     -     -     -     -     -    25 |
 NRC1 |     -    59    30     -   -18     -     -     -     -     -   -64 |
 NRIL |     -     0     -     -   -62     -     -   109     -     -     X |
 NSSP |     -   -54     -     -     -     -     -     -     -     -    46 |
 NTUS |     -   -94     -   -70   -36     -     -     -     -     -   182 |
 NYA1 |     -   108     -     -   -58     -     -     -     -     -    -6 |
 OHI2 |     -    82     -    20    17     -     -     -     -     -  -109 |
 ONSA |     -     -   -13    25     -     -     -     -     -     -     - |
 PDEL |     -   -23     -     -    13     -     -     -     -     -     - |
 PERT |     -     -    14     X     -     -     -     -     -     -   -19 |
 PIE1 |     -     -  -158   536     -     -     -     -     -     -  -170 |
 PIMO |     -     -     -   612     -     -     -     -     -     -  -433 |
 POTS |     -     -     -     -    -8     -     -     -     -     -    12 |
 PRDS |     -     -   -80     -     -     -     -     -     -     -   105 |
 PTBB |     -     6    17     -     -     -     -     -     -     -   -27 |
 QAQ1 |     -  -105    55     -     -     -     -     -     -     -    17 |
 REUN |     -     -     -     -   -84     -     -     -     -     -   124 |
 REYK |     -   107     -     -     -     -     -   -78     -     -   -26 |
 RIOG |     -   -28    63     -   -58     -     -     -     -     -    26 |
 SANT |     -    47     -    40   -46     -     -     -     -     -     - |
 SCH2 |     -    29   115     -     -     -     -  -222     -     -     9 |
 SEY1 |     -     -     -     -   437     -     -     -     -     -  -645 |
 SPT0 |     -  -113    73     -     -     -     -     -     -     -     - |
 STJO |     -    81    33     -     -     -     -  -134     -     -     X |
 STR1 |     -     -    45     -     -     -     -     -     -     -   -59 |
 THTI |     -     -     4   105    58     -     -     -     -     -  -165 |
 THU3 |     -    31   136     -     -     -     -     -     -     -  -206 |
 TID1 |     -     -     -     -     -     -     -   -35     -     -    30 |
 TIDB |     -     -   135  -173     -     -     -     -     -     -   -56 |
 TLSE |     -     -    -8     -     -     -     -     -     -     -    11 |
 TRO1 |     -   214     -     -  -180     -     -     -     -     -    83 |
 UNSA |     -     -     -   -36     -     -     -     -     -     -    25 |
 URUM |     -  -112     -     -     -     -     -     -     -     -    96 |
 USN3 |     -   -19     -     -     -     -     -   -39     -     -    48 |
 USNO |     -   -15    40     -     -     -     -     -     -     -   -38 |
 USUD |     -     -   -27     9     -     -     -    35     -     -     X |
 VILL |     -    16     -   -74     -     -     -     -     -     -    39 |
 WHIT |     -   -43     -     -     -     -     -     -     -     -    37 |
 WILL |     -     9    43     -     -     -     -     -     -     -   -65 |
 WTZR |     -   -88   239  -218     -     -     -     -     -     -   -86 |
 WUHN |     -     -     -     -  -118     -     -     -     -     -   174 |
 YAKT |     -   -20     -     -     -     -     -     -     -     -    17 |
 YAR2 |     -   -49    55     -     -     -     -     -     -     -   -30 |
 YELL |     -     -   -37    36     X     -     -     -     -     -    23 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  7531   113    53   109    30    82  2615   103  4840     -    57 |  288   4.05
    3 |  1891   100    29    28    34    56  2948   108  2010     -    30 |  288   1.97
    4 |  1203    47    31    69    41    71  1644    77  1197     -    32 |  288   0.77
    5 |  8039    73    47    24    42    57  5416    37  8061     -    74 |  288   2.38
    6 |  2505    75    26    41    22    59  4479    59  1872     -    48 |  288   2.34
    7 |   923    49    39    39    17    61   979    25   940     -    74 |  288   0.62
    8 |  4072    32    26    32    21    30  3433    32  3447     -    36 |  288   2.50
    9 |  6628    60    37    42    28    70  4202    40  4169     -    38 |  288   3.23
   10 |  2794    48    19    36    18    39  2423    29  2638     -    50 |  288   1.99
   11 |  1906    59    28    41    24    84  2048    37  1336     -    26 |  288   0.43
   13 |   337    61    40   123    32    81   435    68   488     -    85 |  288   0.21
   14 |  1232    85    30    34    48    58  1267    22  1361     -    66 |  288   0.29
   15 |  2847    35    26    45    27    88  2051    51  2694     -    30 |  288   2.79
   16 |   269    98    24    35    27    60   775    80   284     -    61 |  288   0.35
   17 |  1200    41    28    41    25   100  4089    28  1110     -    52 |  288   1.33
   18 |  1145    36    41    34    32    29  1042    28  1065     -   105 |  288   0.33
   19 |   846   110    26    40    21   138  1585   129  1051     -    54 |  288   0.33
   20 |   553    77    37    46    27    21  1191    31   632     -    49 |  288   0.24
   21 |  1868    49    29    35    19    40   609    48  1628     -    84 |  288   0.32
   22 |  1684    40    38    30    38    60   383    50  1481     -    63 |  288   0.29
   23 |   580    60    25    64    34    98   796    58   644     -    46 |  288   0.46
   24 |  3150    46    35    45    20    60  6596    21  3083     -    47 |  288   1.46
   25 |  2496    48    18    43    22    73  2996    55  2770     -    38 |  288   1.73
   26 |  1142   126    41   119    32    93  1501    53   950     -    66 |  288   0.55
   27 |  1020    41    24    34    17    69   585    54   685     -    72 |  288   0.71
   28 |  2022    70    24    41    19    55  2096    47  2186     -    69 |  288   0.90
   29 |  1766    92    34     X    61     -   750    46  1451     -   112 |  280   0.62
   30 |   884    32    29    33    37    27  1823    46  1143     -    53 |  288   0.39
   31 |  2789    45    34    59    35    40  2175    36  1876     -    28 |  288   1.57
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    38    39     -     -     -     -    46     -     -    17 |  288   0.12
 ALGO |     -     -    11    24     -     -     -    31     -     -    23 |  288   0.01
 ALRT |     -    12     -     -     7     -     -     -     -     -     - |  288   6.04
 AMC2 |     -    20    44     -     -     -     -    47     -     -    19 |  288   0.03
 ARTU |     -     -     -    41    26     -     -    31     -     -     X |  288  11.23
 AUCK |     -     -     -   118     -     -     -     -     -     -    83 |  126  12.94
 BAHR |     -     -    27     -    21     -     -     -     -     -    43 |  288   0.61
 BILI |     -    20     -     -    12     -     -     -     -     -     X |  287   8.04
 BOGT |     -     -     -    28    18     -     -     -     -     -    37 |  288  22.06
 BOR1 |     -    21    30     -     -     -     -     -     -     -    24 |  288   0.30
 BREW |     -     -    37     -     -     -     -    52     -     -    21 |  288   0.06
 BRMU |     -     -     -     -    21     -     -     -     -     -    31 |  288    >>>
 BRUS |     -    24    25     -     -     -     -     -     -     -    19 |  288   0.02
 CAS1 |     -    59     -    65    31     -     -     -     -     -    53 |  288   8.04
 CHAT |     -    31     -     -    22     -     -     -     -     -    29 |  287  12.20
 COCO |     -    26     -    61    30     -     -     -     -     -    28 |  288  15.21
 CRO1 |     -     -    39    58    64     -     -    61     -     -    44 |  281  16.48
 DAEJ |     -    55    35     -     -     -     -     -     -     -     - |  287   1.72
 DAV1 |     -    18     -     -    29     -     -    44     -     -    18 |  288  13.95
 DGAR |     -    29     -     -     -     -     -    31     -     -    28 |  288  20.99
 DRAO |     -    24    17     -     -     -     -    35     -     -    38 |  288   0.08
 DWH1 |     -    46    43     -     -     -     -     -     -     -    23 |  288   0.50
 FAIR |     -     -     -    25    12     -     -     -     -     -     - |  288   0.25
 FLIN |     -    12     -     -     -     -     -    13     -     -     - |  288   8.46
 FORT |     -     -    39    51    31     -     -     -     -     -     - |  288   0.26
 GLPS |     -    29     -     -    20     -     -     -     -     -    21 |  288  23.84
 GODE |     -    31    27    16     -     -     -    30     -     -    27 |  288   0.34
 GOL2 |     -     -    25     -     -     -     -     -     -     -    33 |  228 666.90
 GOLD |     -     -     -    63    31     -     -    31     -     -    49 |  272  11.10
 GRAZ |     -     -    14     -     -     -     -     -     -     -    18 |  288    >>>
 GUAM |     -    43     -    60    32     -     -    42     -     -    28 |  288  19.75
 GUAT |     -     -     -     -    15     -     -     -     -     -    22 |  288    >>>
 HERS |     -     -    29     -     -     -     -     -     -     -    38 |  223  33.38
 HOB2 |     -    26    21     -     -     -     -     -     -     -    22 |  288   0.15
 HOFN |     -     -     -     -    11     -     -     -     -     -    16 |  287    >>>
 HRAO |     -     -     -     -     -     -     -    33     -     -    28 |  288   0.61
 IENG |     -    39    26     -     -     -     -     -     -     -     - |  288   0.48
 IISC |     -    27     -    57    26     -     -     -     -     -     - |  288  26.61
 INVK |     -    12     -     -     -     -     -    12     -     -     X |  287   8.71
 ISPA |     -    22     -     -    16     -     -    27     -     -    46 |  288  17.51
 JPLM |     -     -    44     -     -     -     -    43     -     -    28 |  288   9.33
 KERG |     -    44    50     X    91     -     -     -     -     -    60 |  288   1.37
 KGN0 |     -    34    35     -     -     -     -     -     -     -    32 |  287   0.64
 KIRU |     -    16     -     -     -     -     -    26     -     -    29 |  288   8.06
 KIT3 |     -     -     -    64    35     -     -    42     -     -    16 |  276  12.37
 KOKB |     -     -    21     -    24     -     -    49     -     -    50 |  288   0.09
 KOUR |     -    34     -    49    32     -     -     -     -     -    26 |  288   1.79
 LPGS |     -    66    46    73     -     -     -     -     -     -    50 |  266  28.03
 MAC1 |     -    23     -    67    22     -     -     -     -     -    38 |  288  18.78
 MADR |     -     -     -     -     -     -     -    35     -     -    29 |  284  14.96
 MAS1 |     -     -     -    41     -     -     -    30     -     -    40 |  288   1.96
 MATE |     -    24     -     -     -     -     -     -     -     -    20 |  288   0.12
 MBAR |     -    27     -     -    39     -     -    41     -     -    42 |  288  16.38
 MCM4 |     -    53    34     -     X     -     -     -     -     -     - |  280  30.78
 MEDI |     -     -    15     -     -     -     -     -     -     -    20 |  288   0.11
 MIZU |     -     -    63   139     -     -     -     -     -     -    34 |  288   0.38
 MKEA |     -     -     -    41     -     -     -    29     -     -    14 |  288  29.10
 NKLG |     -     -     -    30     -     -     -     -     -     -    21 |  287    >>>
 NNOR |     -     -    25    54     -     -     -    29     -     -    26 |  288  18.77
 NPLD |     -    14    28     -     -     -     -     -     -     -    31 |  287   0.04
 NRC1 |     -    31    17     -    18     -     -     -     -     -    16 |  288   0.03
 NRIL |     -    29     -     -    10     -     -    31     -     -     X |  288   8.22
 NSSP |     -    18     -     -     -     -     -     -     -     -    15 |  288   9.75
 NTUS |     -    26     -    39    23     -     -     -     -     -    23 |  288  10.87
 NYA1 |     -    36     -     -    10     -     -     -     -     -    27 |  288   0.07
 OHI2 |     -    33     -    72    49     -     -     -     -     -   107 |  288   8.06
 ONSA |     -     -    24    44     -     -     -     -     -     -     - |  280   0.09
 PDEL |     -    14     -     -     8     -     -     -     -     -     - |  288  51.79
 PERT |     -     -    27     X     -     -     -     -     -     -    36 |  288    >>>
 PIE1 |     -     -    34    38     -     -     -     -     -     -    28 |  288   0.08
 PIMO |     -     -     -    18     -     -     -     -     -     -    12 |   78  19.81
 POTS |     -     -     -     -    21     -     -     -     -     -    31 |  288  17.69
 PRDS |     -     -    21     -     -     -     -     -     -     -    28 |  288   2.58
 PTBB |     -    17    20     -     -     -     -     -     -     -    29 |  288   5.46
 QAQ1 |     -    50    30     -     -     -     -     -     -     -    12 |  288   8.67
 REUN |     -     -     -     -    18     -     -     -     -     -    27 |  288  24.86
 REYK |     -    10     -     -     -     -     -    34     -     -    26 |  288   9.74
 RIOG |     -    31    22     -    40     -     -     -     -     -    36 |  288  10.45
 SANT |     -    21     -    30    16     -     -     -     -     -     - |  286   9.95
 SCH2 |     -    32    13     -     -     -     -    38     -     -    10 |  288   4.48
 SEY1 |     -     -     -     -    11     -     -     -     -     -    16 |  288  19.49
 SPT0 |     -    47    30     -     -     -     -     -     -     -     - |  286   0.03
 STJO |     -    16    19     -     -     -     -    35     -     -     X |  288   0.11
 STR1 |     -     -    13     -     -     -     -     -     -     -    18 |  288   0.64
 THTI |     -     -    34    34    24     -     -     -     -     -    55 |  288   9.55
 THU3 |     -    23     8     -     -     -     -     -     -     -    17 |  288   9.33
 TID1 |     -     -     -     -     -     -     -    21     -     -    18 |  288   0.07
 TIDB |     -     -    19    59     -     -     -     -     -     -    29 |  254   0.12
 TLSE |     -     -    52     -     -     -     -     -     -     -    69 |  287   0.96
 TRO1 |     -    26     -     -    18     -     -     -     -     -    12 |  287   8.67
 UNSA |     -     -     -    49     -     -     -     -     -     -    35 |  287  17.66
 URUM |     -    30     -     -     -     -     -     -     -     -    26 |  288  18.43
 USN3 |     -    24     -     -     -     -     -    24     -     -    38 |  288   0.03
 USNO |     -    48    33     -     -     -     -     -     -     -    25 |  273   0.38
 USUD |     -     -    29    46     -     -     -    37     -     -     X |  288   9.40
 VILL |     -    24     -    63     -     -     -     -     -     -    25 |  288  14.70
 WHIT |     -    36     -     -     -     -     -     -     -     -    31 |  288   2.39
 WILL |     -    30    36     -     -     -     -     -     -     -    28 |  288  26.07
 WTZR |     -    19    35    62     -     -     -     -     -     -    17 |  288   0.03
 WUHN |     -     -     -     -    15     -     -     -     -     -    22 |  287  24.84
 YAKT |     -    24     -     -     -     -     -     -     -     -    20 |  288   0.41
 YAR2 |     -    77    38     -     -     -     -     -     -     -    29 |  288 340.98
 YELL |     -     -    23    51     X     -     -     -     -     -    16 |  288   0.15
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2979    48    32    55    30    69  2650    47  2514     -    42 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.97   | 3.84e-14  6.36e-15  1.06e-15 |
 AMC2 |   288     0     0   288    9.97   | 3.19e-14  7.28e-15  2.09e-15 |
 NPLD |   287     0     0   286    9.90   | 3.15e-14  8.77e-15  3.20e-15 |
 SPT0 |   286     0     0   285    9.81   | 3.41e-14  5.86e-15  2.27e-15 |
 USNO |   273     0     0   270    9.35   | 3.59e-14  7.31e-15  2.64e-15 |
 ALGO |   288     0     0   288    8.58   | 2.84e-14  8.74e-15  1.86e-15 |
 BREW |   288     0     0   288    8.31   | 3.41e-14  7.84e-15  4.61e-15 |
 WTZR |   288     0     0   288    5.30   | 3.97e-14  1.03e-14  2.20e-15 |
 ALBH |   288     0     0   288    3.89   | 3.80e-14  1.34e-14  9.58e-15 |
 ONSA |   280     0     0   279    3.78   | 4.38e-14  8.43e-15  4.82e-15 |
 USN3 |   288     0     0   288    2.85   | 8.29e-14  1.13e-14  3.58e-15 |
 NRC1 |   288     1     0   287    2.53   | 8.62e-14  1.32e-14  4.80e-15 |
 KOKB |   288     0     0   288    2.38   | 6.24e-14  1.67e-14  6.07e-15 |
 YELL |   288     2     0   286    2.38   | 3.64e-14  7.74e-15  2.44e-15 |
 NYA1 |   288     0     0   288    1.95   | 2.89e-14  5.88e-15  7.02e-15 |
 GOL2 |   228     1     0   226    1.74   | 3.58e-14  1.01e-14         - |
 DRAO |   288     0     0   288    1.71   | 6.90e-14  1.51e-14  7.29e-15 |
 HOB2 |   288     0     0   288    0.93   | 4.70e-14  1.76e-14  1.36e-14 |
 MATE |   288     0     0   143    0.85   | 4.74e-14  8.67e-15  1.35e-14 |
 PIE1 |   288     0     0   288    0.80   | 4.28e-14  8.20e-15  5.23e-15 |
 FORT |   288     0     0   143    0.49   | 7.63e-14  1.87e-14  1.77e-14 |
 TID1 |   288     0     0   288    0.31   | 4.78e-14  8.35e-15  4.56e-15 |
 MEDI |   288     0     0   288    0.25   | 3.85e-14  9.15e-15  9.72e-15 |
 GODE |   288     0     0   143    0.19   | 2.93e-14  1.07e-14  2.51e-14 |
 G13  |   288     0     3   131    0.17   | 5.84e-13  6.56e-14  1.90e-14 |
 G30  |   288     0     0   288    0.15   | 3.11e-13  9.87e-14  4.50e-14 |
 G16  |   288     0     0   288    0.14   | 4.19e-13  5.68e-14  4.01e-14 |
 G23  |   288     0     0   288    0.13   | 5.62e-13  1.09e-13  3.08e-14 |
 KGN0 |   287     0     0   286    0.12   | 3.74e-13  1.60e-13  3.80e-14 |
 MIZU |   288     0     0   288    0.12   | 3.71e-13  1.02e-13  4.29e-14 |
 G26  |   288     0     0   288    0.08   | 3.64e-13  1.16e-13  6.80e-14 |
 HRAO |   288     0     0   288    0.08   | 1.20e-13  4.66e-14  7.62e-14 |
 TIDB |   254     0     1    22    0.07   | 1.75e-13  2.58e-14         - |
 BOR1 |   288     0     0   288    0.07   | 4.30e-13  1.23e-13  2.23e-14 |
 TLSE |   287     0     0   286    0.06   | 4.55e-13  1.57e-13  7.58e-14 |
 G07  |   288     0     0   288    0.06   | 2.88e-13  1.01e-13  8.13e-14 |
 G27  |   288     0     0   288    0.05   | 3.27e-13  9.60e-14  9.63e-14 |
 IENG |   288     0     0   288    0.05   | 5.61e-13  1.63e-13  5.27e-14 |
 G19  |   288     0     1   123    0.05   | 6.55e-13  8.74e-14  2.69e-14 |
 G29  |   280     0     0   278    0.05   | 4.14e-13  1.59e-13  6.56e-14 |
 STR1 |   288     0     0   288    0.04   | 6.97e-13  1.62e-13  5.76e-14 |
 G17  |   288     0     0   288    0.04   | 6.64e-13  1.87e-13  1.11e-13 |
 G04  |   288     0     0   288    0.04   | 4.50e-13  1.49e-13  8.27e-14 |
 G06  |   288     0     0   288    0.03   | 4.29e-13  1.63e-13  1.23e-13 |
 DWH1 |   288     0     0   143    0.03   | 4.83e-13  1.44e-13  5.68e-14 |
 G31  |   288     0     0   288    0.02   | 1.92e-13  1.33e-13  1.46e-13 |
 BAHR |   288     0     4   122    0.02   | 6.63e-13  1.31e-13  4.89e-14 |
 YAKT |   288     0     0   275    0.02   | 4.15e-13  1.25e-13  3.49e-14 |
 G09  |   288     0     0   288    0.01   | 1.29e-12  4.74e-13  2.17e-13 |
 FAIR |   288     1     1   157    0.01   | 4.43e-13  1.23e-13  1.77e-14 |
 G25  |   288     0     0   288    0.01   | 1.30e-12  3.83e-13  2.08e-13 |
 G24  |   288     0     0   288    0.01   | 1.17e-12  3.83e-13  1.14e-13 |
 G08  |   288     0     0   288    0.01   | 1.37e-12  3.05e-13  2.04e-13 |
 KERG |   288     0     0   288    0.01   | 1.17e-12  3.35e-13  1.51e-13 |
 KOUR |   288     0     0   288    0.01   | 1.50e-12  4.70e-13  1.91e-13 |
 PRDS |   288     0     0   288    0.01   | 1.45e-12  3.92e-13  2.42e-13 |
 WHIT |   288     0     0   288    0.01   | 4.59e-13  2.08e-13  1.60e-13 |
 G05  |   288     0     0   288    0.01   | 1.26e-12  3.72e-13  2.95e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.93e-12  5.23e-13  1.95e-13 |
 DAEJ |   287     0     0   141    0.00   | 1.43e-12  3.21e-13  1.28e-13 |
 STJO |   288     0     1   136    0.00   | 3.56e-14  1.45e-14  8.73e-15 |
 GPST |   288     0     0     0    0.00   | 2.25e-14  5.97e-15  1.37e-15 |
 PIMO |    78     0     0     0    0.00   |        -         -         - |
 MCM4 |   280     0     1     0    0.00   | 6.12e-13  3.88e-13  1.90e-12 |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 SANT |   286     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HERS |   223     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   126     0     0     0    0.00   |        -         -         - |
 G28  |   288     1     6     0    0.00   | 6.04e-13  7.47e-14  4.65e-14 |
 G22  |   288     0     6     0    0.00   | 8.41e-13  7.86e-14  2.07e-14 |
 G21  |   288     0     6     0    0.00   | 8.51e-13  9.92e-14  2.56e-14 |
 G20  |   288     0     6     0    0.00   | 6.66e-13  7.75e-14  2.11e-14 |
 G18  |   288     0     6     0    0.00   | 1.12e-12  1.05e-13  2.62e-14 |
 G15  |   288     0     0     0    0.00   | 1.49e-12  5.78e-13  3.25e-13 |
 G14  |   288     0     6     0    0.00   | 6.31e-13  6.15e-14  3.38e-14 |
 G11  |   288     0     6     0    0.00   | 7.61e-13  7.50e-14  5.79e-14 |
 G10  |   288     0     0     0    0.00   | 1.18e-12  4.76e-13  1.70e-13 |
 G03  |   288     0     0     0    0.00   | 1.38e-12  4.71e-13  1.31e-13 |
 G01  |   288     0     0     0    0.00   | 1.55e-12  6.98e-13  4.92e-13 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   287     0     0     0    0.00   |        -         -         - |
 TRO1 |   287     0     0     0    0.00   |        -         -         - |
 THU3 |   288     2     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.55e-13  2.19e-13  7.24e-13 |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   | 6.27e-13  3.34e-13  3.84e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 REUN |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     2     0     0    0.00   |        -         -         - |
 PTBB |   288     2     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MADR |   284     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   266     0     0     0    0.00   |        -         -         - |
 KIT3 |   276     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 6.02e-13  3.41e-13  9.37e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   287     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   272     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   281     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     1     0    0.00   | 2.66e-13  1.07e-12  1.65e-12 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.79e-17  2.15e-16  1.29e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      SPT0      BRUS |
------------------------------------------+------------------------------+
