
 GPS week: 1212   Day: 6   MJD: 52734                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2683      0     0.02    -0.24     4.03     0.00
 cod |   288     0  19881      0     0.21    -0.33     0.05    30.69
 emr |   288     0  12959     24   600.04    37.08     0.07    21.75
 esa |   287     0  17289   1128    -0.19    -0.87     0.11    13.35
 gfz |   288     0  14711      0     0.05    -0.55     0.05    34.20
 igu |    96     0   2491     28    -0.16     0.99     3.24     0.00
 ngs |    96     0   2683      0     0.02    -0.30     3.89     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio |
 -----+-------------------------------------------------+
    1 |   368   -37    -7    66    12  1404  -163     - |
    2 | -1446   -19  -167   102    86     -  -675     - |
    3 |   782    13   -47   227   -53 -1306   763     - |
    4 |  -666    53   -58    21   -19  1054  -691     - |
    5 |   -75    78  -101    -6    -6 -2522   -85     - |
    6 |  -436    64  -190   158     2  -114  -298     - |
    7 |    65   -16   -53   110     5  1100    47     - |
    8 |  3098    -5  -101   102    29  4170  2275     - |
    9 | -1240    96  -259   135    26   -24 -1486     - |
   10 |   859   -32  -263   224   115  3773   890     - |
   11 |  2599   -55   290    50  -153 -1381  2545     - |
   13 |  4372  -121   170    -5     3   758  4477     - |
   14 |  3820   156   -37   -12  -111  1494  3801     - |
   15 |  3729    42  -154     -    60     -  3610     - |
   16 |  1063    60   154   124  -208   -95  1139     - |
   17 | -5829   -21  -281   138   143  4257 -5056     - |
   18 |  1059   -88   147  -149    52  -871  1130     - |
   20 |  3414  -175   143    98    35   921  3716     - |
   22 | -2205    -1  -189     X   125 10185 -2832     - |
   23 |   227    16  -258   107   104 -1118  -189     - |
   24 | -1092   105   -10   -49   -69 -1869  -904     - |
   25 | -1748    92  -216   -42    71  6324 -1919     - |
   26 |   134    -4  -288    11   183  -796    41     - |
   27 | -2031   -90  -124    46   142-14924 -1736     - |
   28 | -4025    83   202   -97  -175 -5096 -3027     - |
   29 | -2608    27  -266    48   126 -3833 -2631     - |
   30 | -2084   100  -178    82   -13 -3478 -2175     - |
   31 |  -158   -53   -70    56    70 -2041  -633     - |
 -----+-------------------------------------------------+
 ALBH |     -   -32    46     -     -     -     -     - |
 ALGO |     -   -39   120     X   -42     -     -     - |
 AMC2 |     -  -212   299     -     -     -     -     - |
 AREQ |     -     -    72   -21   -38     -     -     - |
 ARTU |     -    49     -     -   -44     -     -     - |
 ASC1 |     -   -16     -     7    12     -     -     - |
 AUCK |     -     7     -   -15     -     -     -     - |
 BAHR |     -   -13   117  -162     -     -     -     - |
 BRMU |     -     -     -   304  -119     -     -     - |
 CAS1 |     -    24     -    67   -48     -     -     - |
 CEDU |     -    75     -  -173     -     -     -     - |
 CHAT |     -   -46     -   106     -     -     -     - |
 CHUR |     -    13   -18     -     -     -     -     - |
 COCO |     -    55     -  -136     4     -     -     - |
 CRO1 |     -   -60    84     -     -     -     -     - |
 DAVR |     -    70     -     -   -62     -     -     - |
 DRAO |     -   -47    66     -     -     -     -     - |
 FAIR |     -     -    84    86   -83     -     -     - |
 FORT |     -  -158   198     X   -15     -     -     - |
 GODE |     -  -130   199   -26     -     -     -     - |
 GOLD |     -    38     -   -88     -     -     -     - |
 GRAZ |     -  -123   256  -136     -     -     -     - |
 GUAM |     -   101     -  -232     -     -     -     - |
 KOKB |     -   -15     -     -    14     -     -     - |
 KOUR |     -    44     -  -100     -     -     -     - |
 LPGS |     -    69     -  -158     -     -     -     - |
 MAC1 |     -     3     -   160   -64     -     -     - |
 MALI |     -     -     -  -243    95     -     -     - |
 MAS1 |     -     -   178   -17  -106     -     -     - |
 MDO1 |     -     -   249  -406     -     -     -     - |
 MKEA |     -    48     -    41   -59     -     -     - |
 NKLG |     -    61     -     -   -55     -     -     - |
 NYAL |     -     -    -3     4     -     -     -     - |
 OHI2 |     -   -39     -     -    35     -     -     - |
 OS0G |     -   -10     -    98   -29     -     -     - |
 PERT |     -   150     -  -531    71     -     -     - |
 PIE1 |     -     2     -    -4     -     -     -     - |
 POTS |     -    -3     -     7     -     -     -     - |
 SANT |     -  -142     -   328     -     -     -     - |
 THTI |     -     -     -   155   -61     -     -     - |
 THU3 |     -     6     -     -    -5     -     -     - |
 TIDB |     -   -13     -   183   -59     -     -     - |
 TIXI |     -    -6     -     -     5     -     -     - |
 TRO1 |     -    60     -     -   -54     -     -     - |
 TSKB |     -   -93   161   -55     -     -     -     - |
 USNO |     -   -73   103     -     -     -     -     - |
 USUD |     -   -48     -   110     -     -     -     - |
 VILL |     -   290     -  -667     -     -     -     - |
 WTZR |     -   -48     -   109     -     -     -     - |
 WUHN |     -   -40     -  -140    90     -     -     - |
 YAKT |     -   -35    49     -     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  3884    34    54    79    27  3884  4020     - |  288   3.95
    2 |  4770    75   145   223    45     -  4906     - |  288   2.29
    3 |  3808    73    59   177    35  2713  3538     - |  288   2.70
    4 |  1138    37    41   183    67   671  1122     - |  288   0.78
    5 |  6858    72    63   116    36  4584  5709     - |  288   3.56
    6 | 11207    47    43   101    22  4190 11478     - |  288  10.65
    7 |  1075    45    68    94    77   965  1270     - |  288   0.93
    8 |  5906    50    51   135    72  3348  5828     - |  288   3.11
    9 |  2613    66    54   121    29  1561  2615     - |  288   1.78
   10 |  2967   160    55   156   108  3039  3083     - |  283   3.17
   11 |   988    61    64   119    37  1147  1014     - |  288   0.33
   13 |   531    27    51    81    68   804   498     - |  288   0.27
   14 |   919    47    42   140    15   567   909     - |  288   0.21
   15 |  2176    42    67     -    33     -  2349     - |  288   2.37
   16 |  1477    71    66   218    64  1299  1280     - |  288   0.39
   17 |  4430    37    66    82    18  5739  3998     - |  288   2.17
   18 |  1213    52   119   108    49   851  1075     - |  288   0.33
   20 |   682    52    62   139    47   702   579     - |  288   0.24
   22 |  6161    86   119     X   119  5764  5000     - |  278   5.82
   23 |  6618    82   202    99    72  3018  6330     - |  288   6.33
   24 |  2065    44    32   126    38  3232  2283     - |  288   2.00
   25 |  4565   110    94   130    36  3864  4610     - |  288   3.07
   26 |  2208    55    73    54    31  1813  2192     - |  288   0.65
   27 |  1209    43    56    77    54  8201  1090     - |  288   1.06
   28 |  4488    64    89   226    55  2118  4381     - |  288   0.88
   29 |  2092    59    49    69    24  2458  1573     - |  288   0.38
   30 |  1509    68    68    59    59  3104  1208     - |  288   0.99
   31 |  3463    56    54   101    15  3397  3171     - |  288   2.06
 -----+-------------------------------------------------+--------------
 ALBH |     -    47    67     -     -     -     -     - |  280   0.28
 ALGO |     -    36    27     X    24     -     -     - |  288   0.03
 AMC2 |     -    61    86     -     -     -     -     - |  284   0.06
 AREQ |     -     -   107    56    50     -     -     - |  288  27.53
 ARTU |     -    19     -     -    17     -     -     - |  288  12.36
 ASC1 |     -    30     -    44    31     -     -     - |  279    >>>
 AUCK |     -    88     -   202     -     -     -     - |  150  10.74
 BAHR |     -    22    25    30     -     -     -     - |  288   0.24
 BRMU |     -     -     -    28    11     -     -     - |  101    >>>
 CAS1 |     -    30     -    55    21     -     -     - |  288   7.51
 CEDU |     -    21     -    49     -     -     -     - |  262  13.40
 CHAT |     -    17     -    40     -     -     -     - |  250  11.03
 CHUR |     -    37    53     -     -     -     -     - |  220   0.69
 COCO |     -    18     -   147    50     -     -     - |  288   9.57
 CRO1 |     -    22    31     -     -     -     -     - |  283  25.70
 DAVR |     -    29     -     -    26     -     -     - |  288  22.26
 DRAO |     -    21    29     -     -     -     -     - |  288   0.06
 FAIR |     -     -    83   184    78     -     -     - |  274   0.35
 FORT |     -    79    60     X    42     -     -     - |  285   0.07
 GODE |     -    73   153   169     -     -     -     - |  284   0.22
 GOLD |     -    30     -    68     -     -     -     - |  226  20.34
 GRAZ |     -   105    70   231     -     -     -     - |  288  42.31
 GUAM |     -    21     -    49     -     -     -     - |  283  21.17
 KOKB |     -    43     -     -    38     -     -     - |  280   0.05
 KOUR |     -    20     -    47     -     -     -     - |  286   1.52
 LPGS |     -    48     -   111     -     -     -     - |  266  43.17
 MAC1 |     -    28     -    60    28     -     -     - |  288  13.91
 MALI |     -     -     -   230    90     -     -     - |  152    >>>
 MAS1 |     -     -    32    50    27     -     -     - |  288   2.55
 MDO1 |     -     -    39    63     -     -     -     - |  183  17.85
 MKEA |     -    61     -    36    56     -     -     - |  288  42.08
 NKLG |     -    18     -     -    16     -     -     - |  263 243.63
 NYAL |     -     -    37    61     -     -     -     - |  286   0.11
 OHI2 |     -    27     -     -    25     -     -     - |  287   7.29
 OS0G |     -    30     -    46    16     -     -     - |  288   0.23
 PERT |     -    23     -   106    41     -     -     - |  285   2.87
 PIE1 |     -    30     -    70     -     -     -     - |  281   0.04
 POTS |     -    24     -    55     -     -     -     - |  276  15.54
 SANT |     -    24     -    55     -     -     -     - |  286   6.37
 THTI |     -     -     -    59    23     -     -     - |  286   3.41
 THU3 |     -    26     -     -    23     -     -     - |  279   8.27
 TIDB |     -    42     -    71    33     -     -     - |  288   0.06
 TIXI |     -    15     -     -    13     -     -     - |  278   9.03
 TRO1 |     -    31     -     -    28     -     -     - |  287  11.11
 TSKB |     -    29    30    84     -     -     -     - |  288   1.05
 USNO |     -    35    50     -     -     -     -     - |  288   0.06
 USUD |     -    23     -    53     -     -     -     - |  287  13.59
 VILL |     -    24     -    54     -     -     -     - |  285   2.80
 WTZR |     -    18     -    42     -     -     -     - |  287   0.03
 WUHN |     -    14     -    68    21     -     -     - |  287  21.33
 YAKT |     -    19    27     -     -     -     -     - |  288   2.50
 -----+-------------------------------------------------+--------------
 TOT  |  4032    52    74   112    47  3241  3887     - |


 BEST CLOCK FIT: WTZR   287   0.03 (ns) 

