
 GPS week: 1212   Day: 4   MJD: 52732                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2592      0     0.11     0.08     4.03     0.00
 cod |   288     0  21577     21     0.34    -0.48     0.06    17.97
 emr |   288     0  19721    110   527.32    36.65     0.08    13.77
 esa |   286     0  18800   3027    -0.88     0.89     0.10     9.72
 gfz |   288     0  16050     73    -0.89     0.66     0.05    27.05
 igu |    96     0   2496      0     0.08    -0.08     3.58     0.00
 jpl |   288     0  13358   1220     1.44    -1.49     0.08    13.81
 ngs |    96     0   2592      0     0.12     0.07     3.85     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     2  30947    947   504.48    11.50     0.07    17.69

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -4259  -107   -51   146    91 -4060   -96 -3952     -   -30 |
    3 |  -460   -48  -178   160    53  7163   -72  -515     -    45 |
    4 | -4132   140  -174   170    25 -5033  -117 -3670     -  -100 |
    5 |  5461   140  -233   130   -75  6239   147  3055     -    11 |
    6 | -1988   203  -243    81    41 -9114   109 -2613     -  -168 |
    7 |   571    49     9   150  -110  -633   130   473     -   -17 |
    8 | -8894   -34  -207   251    12 -3274   119 -8671     -    -9 |
    9 | -5215   111  -389   207    42 -1655     1 -4818     -    12 |
   10 | -4817   -95  -250   179    52  -933   278 -3864     -     X |
   11 |  5641  -161   188    -4    -1  3828  -112  5214     -    61 |
   13 |  3410   -71    30    11   110  4150  -157  3645     -   -71 |
   14 |  2946   172    17   -66   -54  2018   -44  3172     -   -54 |
   15 |  -842    20  -117     -   -32 14559   171  -425     -    42 |
   16 |  -605    64    37   163  -113  2150     X   -12     -   -16 |
   17 | -6650   -59  -236    64   136     -   238 -6013     -   -93 |
   18 |  2608  -112   -57   190   120  2450   -84  2862     -   -88 |
   20 |  1053  -298   139   199    33  2806   263  1588     -   -74 |
   22 | 13604   131  -272   -41   -63 -3838   260 13137     -   117 |
   23 |   144   130  -423   202    61   176   170  -429     -  -111 |
   24 |  3244    49  -150   247   -14  6936     X  3278     -   -47 |
   25 |  2356   204  -294    43    83  5469  -154   998     -   -58 |
   26 | -3338   251  -353  -118   179  1728    10 -2886     -  -195 |
   27 |   654   -68  -189   199    93-13675   176   627     -   -98 |
   28 |  1751    95   195   111  -118 -6755  -162  1951     -   -68 |
   29 | -1743   237  -343  -136   142   848    47 -1459     -  -137 |
   30 | -1847   246  -236   124    20 -6471  -175 -1799     -  -107 |
   31 |  1350   -88  -199    72    88 -5078   -52  1128     -    87 |
 -----+-------------------------------------------------------------+
 ALGO |     -     -    15  -216     -     -   147     -     -    -8 |
 AMC2 |     -  -251   200     -     -     -     -     -     -   102 |
 AREQ |     -     4   -84   -34    29     -   -27     -     -    58 |
 ARTU |     -   -48     -     -   -47     -   149     -     -     - |
 ASC1 |     -     -     -  -653   126     -     -     -     -    52 |
 AUCK |     -     6     -     X     -     -     -     -     -    -6 |
 BAHR |     -     0    68    11     -     -     -     -     -   -59 |
 BJFS |     -     -   282     -  -221     -     -     -     -   123 |
 BOGT |     -    63     -   368     -     -   -63     -     -  -217 |
 BOR1 |     -    79   165     -     -     -     -     -     -  -204 |
 BRMU |     -     -     -   431   -10     -     -     -     -   -68 |
 BRUS |     -     -    56     -     -     -   173     -     -  -180 |
 CAS1 |     -    73     -    18   -52     -    44     -     -   -39 |
 CEDU |     -    25     -   235     -     -     -     -     -  -150 |
 CHAT |     -   -16     -   -95     -     -     -     -     -    68 |
 CHUR |     -   -44   291     -     -     -   102     -     -  -246 |
 COCO |     -   142     -  -313    10     -   -27     -     -    44 |
 CRO1 |     -     -    86     -     -     -    97     -     -  -144 |
 DAVR |     -   129     -     -   -55     -     -     -     -   -46 |
 DRAO |     -     -   -49     -     -     -     -     -     -    38 |
 FAIR |     -    79    95     X   -42     -  -167     -     -    40 |
 FORT |     -     -   151     X   -18     -     -     -     -  -109 |
 GODE |     -   -79    61     X     -     -     -     -     -    20 |
 GOLD |     -   -22     -     7     -     -  -125     -     -   112 |
 GRAZ |     -     -    95     -     -     -     -     -     -   -74 |
 GUAM |     -     -     -  -178     -     -   -53     -     -   136 |
 GUAT |     -     -     -     -   -56     -   -52     -     -   126 |
 HOB2 |     -   -46   145     X     -     -     -     -     -   -70 |
 HRAO |     -    58     -     -     -     -  -103     -     -    24 |
 IISC |     -    -2     -     X     7     -     X     -     -    -9 |
 JPLM |     -     -   451     -  -412     -     -     -     -   149 |
 KGN0 |     -     -   -49     -     -     -     -     -     -    38 |
 KIRU |     -     -   127     -     -     -     -     -     -   -99 |
 KOKB |     -  -208    -4     -    40     -     -     -     -   153 |
 KOUR |     -   179     -  -392     -     -     -     -     -    32 |
 KUNM |     -     -     -     -     -     -  -188     -     -   147 |
 LPGS |     -   113     -  -374     -     -     -     -     -    95 |
 MAC1 |     -    78     -   163  -154     -     -     -     -    67 |
 MADR |     -   -10    13     -     -     -     -     -     -     X |
 MALI |     -     -     -     X  -286     -     -     -     -   437 |
 MAS1 |     -     -    26     X    33     -     -     -     -   -70 |
 MATE |     -     -     -  -513     -     -     -     -     -   282 |
 MAW1 |     -    -4     -     -     -     -    44     -     -   -30 |
 MCM4 |     -   204     -     -     -     -     X     -     -  -208 |
 MDO1 |     -     -    15     -     -     -     -     -     -   -12 |
 MEDI |     -  -621     -     -     -     -     -     -     -   631 |
 METS |     -     -    79     -     -     -     -     -     -   -61 |
 MIZU |     -     -   -41     -     -     -     -     -     -    32 |
 MKEA |     -   -23     -   -21  -107     -   -42     -     -   233 |
 NKLG |     -     -     -     -    -6     -   214     -     -  -157 |
 NLIB |     -  -174   151     -     -     -   117     -     -    -4 |
 NRC2 |     -     -   115  -435    22     -   132     -     -    10 |
 NRIL |     -     -     -     -   -28     -    55     -     -     - |
 NYA1 |     -    56     -     -     -     -     -     -     -   -57 |
 NYAL |     -     -   114   -17     -     -     -     -     -   -80 |
 OHI2 |     -    57     -     -   -20     -   -28     -     -     - |
 OS0G |     -   -20    92    48   -39     -     -     -     -   -18 |
 PERT |     -     -   220  -556    48     -     -     -     -    61 |
 PETP |     -   -60     -     -     -     -    78     -     -     - |
 PIE1 |     -    30   161     X     -     -     X     -     -  -156 |
 PIMO |     -   177     -     -   198     -  -606     -     -     X |
 POL2 |     -   -24     -     -     -     -     -     -     -    25 |
 POTS |     -     -     -    60     -     -     -     -     -   -33 |
 RBAY |     -   -86     -     -    85     -     -     -     -   -56 |
 RIOG |     -    46     -     -   -65     -     -     -     -    54 |
 SANT |     -  -186     -     X     -     -   182     -     -    47 |
 SCH2 |     -    29   -73     -     -     -     -     -     -    26 |
 SELE |     -  -190     -    16     -     -   173     -     -    -1 |
 SFER |     -     -   -52     -     -     -     -     -     -    40 |
 STJO |     -  -115    69     -     -     -    50     -     -    20 |
 SUTH |     -   -52     -  -114     -     -     -     -     -   116 |
 THTI |     -     -     -   308    11     -     -     -     -  -186 |
 TLSE |     -  -226   280     -     -     -     -     -     -    11 |
 TRO1 |     -     -     -     -   -39     -     -     -     -    60 |
 TROM |     -     -     -    20     -     -  -320     -     -   253 |
 TSKB |     -     -    74   -76     -     -     -     -     -   -16 |
 TWTF |     -   -16  -169     -     -     -     -     -     -   145 |
 URUM |     -   -54     -     -     -     -     -     -     -    55 |
 USN1 |     -     -   459     -     -     -  -512     -     -    48 |
 USNO |     -    -6    56     -     -     -     -     -     -   -37 |
 USUD |     -     0   -52    86     -     -   -69     -     -    47 |
 VILL |     -     7     -     X     -     -     -     -     -    -7 |
 WSRT |     -   -92   231     -     -     -     -     -     -   -94 |
 WTZR |     -   -95   332  -290     -     -     -     -     -   -10 |
 WUHN |     -     -  -118    42   178     -     -     -     -  -204 |
 YAKT |     -     -   -67     -     -     -   -60     -     -    96 |
 YAR2 |     -    38     -     -     -     -     -     -     -   -38 |
 YELL |     -     -     -  -503     -     -     -     -     -   276 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6119    40    33    50    27  4375    39  6040     -    64 |  288   4.67
    3 |  3799    79    51   104    54  5376    49  3573     -    68 |  288   1.87
    4 |  1647    76    37    89    60  2913   241  1423     -    61 |  288   0.49
    5 |  9196   124    89   105    40  4559    81  7694     -    71 |  288   4.32
    6 |  7006    57    50    60    36  3969    54  8007     -    89 |  288   8.15
    7 |  1997    48    55    56    50   481   118  1838     -    35 |  288   0.89
    8 |  2630    74    30   169    35  1941    48  2716     -    18 |  288   2.20
    9 |  3054    62    43   143    42  2667   146  3222     -    48 |  288   1.68
   10 |  3302    59    96   141    36  2895   125  2377     -     X |  288   2.06
   11 |  1666    57    29    93    37  2862    59  1074     -    74 |  288   0.39
   13 |  1247    42    26    26    28  2736    59   989     -    48 |  288   0.24
   14 |  1278    58    31   117    56  1329    48  1026     -    28 |  288   0.29
   15 |  2144    60    50     -    19  5448    39  2096     -    41 |  288   1.83
   16 |  2629    85    79   114    36  1146     X  2392     -   110 |  288   0.28
   17 |  4498    82    57    93    49     -    72  3754     -   162 |  288   2.83
   18 |  1175    71    65   163    31  1913    64   825     -    32 |  288   0.32
   20 |  1622    58    73   141    52  1965   146  1385     -    77 |  288   0.25
   22 |  6565    80   146   137    64  5676    73  7222     -   214 |  288   6.79
   23 |  7946   120   120    93    78  4133   126  7587     -    92 |  288   6.25
   24 |  3352    51    36    50    24  4450     X  3332     -    41 |  288   2.44
   25 |  7068    55    61   144    75  1728    74  6346     -    75 |  288   1.96
   26 |  2106    37    39    41    36  1217    38  1880     -   102 |  288   0.49
   27 |  1729    56    50    85    28  7761    41  1352     -    29 |  288   0.98
   28 |   622    82    55   124    21  2789    45   745     -    28 |  288   0.77
   29 |  1432    41    47   102    16   752    34  1247     -    68 |  288   0.75
   30 |   993   135   170   111   105  2980   158  1038     -   138 |  288   0.66
   31 |  1954    52    43    87    38  4043    49  1687     -    57 |  288   1.31
 -----+-------------------------------------------------------------+--------------
 ALGO |     -     -    49   255     -     -    82     -     -    45 |  288   0.04
 AMC2 |     -    39    59     -     -     -     -     -     -    34 |  288   0.04
 AREQ |     -    36    37    65    16     -    63     -     -    56 |  288  28.96
 ARTU |     -    48     -     -    26     -    82     -     -     - |  272  15.62
 ASC1 |     -     -     -    68    20     -     -     -     -    38 |  286    >>>
 AUCK |     -    24     -     X     -     -     -     -     -    24 |  262  12.63
 BAHR |     -    44    19    27     -     -     -     -     -    38 |  288   0.35
 BJFS |     -     -   103     -    72     -     -     -     -    78 |  269    >>>
 BOGT |     -    24     -   158     -     -    66     -     -    82 |  288  29.63
 BOR1 |     -    49    75     -     -     -     -     -     -    49 |  288   0.46
 BRMU |     -     -     -   123    36     -     -     -     -    36 |  286    >>>
 BRUS |     -     -    37     -     -     -    35     -     -    24 |  288   0.05
 CAS1 |     -    32     -    72    22     -    68     -     -    55 |  288   6.73
 CEDU |     -    31     -    50     -     -     -     -     -    32 |  286  13.48
 CHAT |     -    24     -    33     -     -     -     -     -    33 |  287  10.84
 CHUR |     -    80    88     -     -     -    93     -     -   115 |  285   0.74
 COCO |     -    34     -   114    28     -    58     -     -    43 |  288  11.42
 CRO1 |     -     -    46     -     -     -    85     -     -   100 |  288  23.64
 DAVR |     -    56     -     -    38     -     -     -     -   107 |  288  26.50
 DRAO |     -     -    14     -     -     -     -     -     -    11 |  286   0.05
 FAIR |     -    39    33     X    15     -    29     -     -    34 |  254   0.10
 FORT |     -     -    23     X    13     -     -     -     -    16 |  288   0.08
 GODE |     -    32    74     X     -     -     -     -     -    47 |  286   0.13
 GOLD |     -    42     -   157     -     -   109     -     -    33 |  288  27.97
 GRAZ |     -     -    38     -     -     -     -     -     -    29 |  285  41.87
 GUAM |     -     -     -    67     -     -    38     -     -    21 |  286  24.23
 GUAT |     -     -     -     -    21     -    50     -     -    41 |  286    >>>
 HOB2 |     -    42    74     X     -     -     -     -     -    35 |  280   0.05
 HRAO |     -    51     -     -     -     -    78     -     -    34 |  288  26.03
 IISC |     -   107     -     X    90     -     X     -     -   110 |  261  44.01
 JPLM |     -     -   151     -    66     -     -     -     -    67 |  286  56.43
 KGN0 |     -     -    93     -     -     -     -     -     -    73 |  284   0.76
 KIRU |     -     -    74     -     -     -     -     -     -    58 |  253  20.07
 KOKB |     -    32   102     -    29     -     -     -     -    47 |  288   0.06
 KOUR |     -    98     -   221     -     -     -     -     -    62 |  288   2.05
 KUNM |     -     -     -     -     -     -    60     -     -    46 |  267  33.72
 LPGS |     -    29     -    56     -     -     -     -     -    45 |  287  20.05
 MAC1 |     -    35     -    84    21     -     -     -     -    39 |  288  12.42
 MADR |     -   113   147     -     -     -     -     -     -     X |  278  16.69
 MALI |     -     -     -     X    46     -     -     -     -    70 |  282    >>>
 MAS1 |     -     -   150     X    39     -     -     -     -    63 |  288   2.20
 MATE |     -     -     -    33     -     -     -     -     -    18 |  182   0.09
 MAW1 |     -    55     -     -     -     -    50     -     -    27 |  278  31.24
 MCM4 |     -   121     -     -     -     -     X     -     -   123 |  273  19.01
 MDO1 |     -     -    76     -     -     -     -     -     -    59 |  286   3.70
 MEDI |     -    28     -     -     -     -     -     -     -    28 |  284   0.08
 METS |     -     -    48     -     -     -     -     -     -    37 |  285    >>>
 MIZU |     -     -   261     -     -     -     -     -     -   203 |  217   0.49
 MKEA |     -    43     -    90    34     -    68     -     -    46 |  288  45.27
 NKLG |     -     -     -     -    26     -    66     -     -    29 |  287    >>>
 NLIB |     -    51   187     -     -     -    54     -     -    56 |  280 360.79
 NRC2 |     -     -    20    57    18     -    35     -     -    22 |  288   0.02
 NRIL |     -     -     -     -    28     -    54     -     -     - |  275  11.95
 NYA1 |     -    27     -     -     -     -     -     -     -    28 |  262   0.06
 NYAL |     -     -    23    48     -     -     -     -     -    16 |  288   0.06
 OHI2 |     -    32     -     -    23     -    56     -     -     - |  288   7.75
 OS0G |     -    45    76    48    17     -     -     -     -    18 |  288   0.41
 PERT |     -     -    67    92    28     -     -     -     -    29 |  288   2.34
 PETP |     -    96     -     -     -     -   124     -     -     - |  259  11.67
 PIE1 |     -    57   102     X     -     -     X     -     -    34 |  288   0.04
 PIMO |     -    67     -     -    60     -   169     -     -     X |  222  26.94
 POL2 |     -    18     -     -     -     -     -     -     -    18 |  281  21.79
 POTS |     -     -     -    55     -     -     -     -     -    30 |  272  14.92
 RBAY |     -   134     -     -   141     -     -     -     -   152 |  240 638.70
 RIOG |     -    79     -     -    32     -     -     -     -    69 |  288  18.64
 SANT |     -    49     -     X     -     -    56     -     -    58 |  288   6.55
 SCH2 |     -    25    47     -     -     -     -     -     -    19 |  274   5.49
 SELE |     -    25     -    93     -     -    60     -     -    41 |  288  26.33
 SFER |     -     -    83     -     -     -     -     -     -    65 |  277   0.36
 STJO |     -    36    14     -     -     -    51     -     -    20 |  288  23.65
 SUTH |     -    32     -    53     -     -     -     -     -    27 |  288  25.51
 THTI |     -     -     -    52    21     -     -     -     -    37 |  287   3.04
 TLSE |     -   163    98     -     -     -     -     -     -   160 |  283   0.52
 TRO1 |     -     -     -     -    27     -     -     -     -    41 |  284  12.98
 TROM |     -     -     -    30     -     -    20     -     -    20 |  267  16.17
 TSKB |     -     -    37    38     -     -     -     -     -    26 |  288   1.17
 TWTF |     -    51   118     -     -     -     -     -     -    74 |  285   0.46
 URUM |     -    37     -     -     -     -     -     -     -    37 |  213  15.83
 USN1 |     -     -    76     -     -     -   129     -     -    73 |  288   0.05
 USNO |     -    21    19     -     -     -     -     -     -    15 |  288   0.03
 USUD |     -    55   138    42     -     -    54     -     -    27 |  288  14.58
 VILL |     -    26     -     X     -     -     -     -     -    27 |  286   2.27
 WSRT |     -    49    60     -     -     -     -     -     -    25 |  285   0.03
 WTZR |     -    53    64    47     -     -     -     -     -    20 |  288   0.20
 WUHN |     -     -   131    61    37     -     -     -     -    54 |  287  25.03
 YAKT |     -     -   113     -     -     -    77     -     -    48 |  282    >>>
 YAR2 |     -    27     -     -     -     -     -     -     -    28 |  225   5.56
 YELL |     -     -     -    35     -     -     -     -     -    19 |  182   0.03
 -----+-------------------------------------------------------------+--------------
 TOT  |  4030    64    82   102    45  3575    80  3847     -    65 |


 BEST CLOCK FIT: NRC2   288   0.02 (ns) 

