
 cls-file Version 2.0
 GPS week: 0811   Day: 4   MJD: 49925                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2194      0    1849   -5278  76536  76536      0  78262  78262      0    0.00
 em1 |   288     0  15926    269 -999999  -24872     57     72     42    326    296    348   34.50
 es1 |   288     0  21800    284   -1296  -11183     58     76     47    524    558    507   32.29
 gf1 |   288     0  21784    377    -352  -16226     57     69     50    600    366    683   33.21
 igf |    96     0   2290      0    1777   -4784    964    964      0   1322   1322      0    0.00
 ng1 |    96     0   2290      0    2674  -19264  76702  76702      0  78985  78985      0    0.00
 pd1 |    96     0   2194      0    1851   -5278  76514  76514      0  78239  78239      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 |
 -----+-------------------------------------------------+
    1 |  1402   222   -34  -198   962  1252  1180     - |
    2 |  -147   487  -618    95  -140 -9027  -190     - |
    4 |   276  -398  1065  -622   275 -1280   322     - |
    5 |    91   287  -345    37   289 17045   149     - |
    6 |  -525  -129   510  -362  -792 -6466  -915     - |
    7 | -1298   192  -537   322   712 -2883  -995     - |
    9 |  -650   -29   395  -355   327-10770  -493     - |
   14 |   -44   -67   551  -465  -888  6991   438     - |
   15 |   154   430  -727   261    17 12101   155     - |
   16 |  3360   261  -398   120   712 -6021  3504     - |
   17 |  -106   229  -437   187   238 10408    32     - |
   18 |  1671   155   232  -386   484  4635  1226     - |
   19 | -2184   -30   172  -136 -1281 -8506 -2322     - |
   20 |   316   119    65  -186  -596  7052    62     - |
   21 | -3120     7    19   -25  -712 17586 -2511     - |
   22 |   922   732  -912   126  1371-16455   720     - |
   23 |  -734   237  -128  -120  -346  8084  -742     - |
   24 |  -208  -297   433  -113  -708 -3750  -544     - |
   25 |   404  -151   591  -417   288 -8453   663     - |
   26 |  1508  -409  1160  -699   164  6014  1073     - |
   27 |  -360   150    66  -220  -150-24104  -143     - |
   28 |     -   213   656  -859 -1829  3685     -     - |
   29 |  -350  -152   695  -517   148 -2982  -407     - |
   31 |   629   255  -245   -27  1371  7716   796     - |
 -----+-------------------------------------------------+
 ALBH |     -   -39   256  -208     -     -     -     - |
 ALGO |     -     -   228  -222     -     -     -     - |
 BOGT |     -     -  -501   487     -     -     -     - |
 BRAZ |     -     -   171  -167     -     -     -     - |
 BRMU |     -     -   137  -133     -     -     -     - |
 BRUS |     -   -21   221  -193     -     -     -     - |
 CAS1 |     -     -   202  -196     -     -     -     - |
 CEDU |     -     -   198  -193     -     -     -     - |
 CHUR |     -    13   372  -430     -     -     -     - |
 DARW |     -    90   125  -215     -     -     -     - |
 DRAO |     -    61   205  -263     -     -     -     - |
 FAIR |     - -1000 -1134  2141     -     -     -     - |
 GODE |     -   134    64  -202     -     -     -     - |
 GRAS |     -     -   211  -205     -     -     -     - |
 GRAZ |     -  -369  -841  1201     -     -     -     - |
 GUAM |     -     -    88   -85     -     -     -     - |
 HARV |     -     -   185  -180     -     -     -     - |
 HERS |     -     -  -574   558     -     -     -     - |
 HOB2 |     -     -   175  -170     -     -     -     - |
 JOZE |     -   142   245  -501     -     -     -     - |
 KARR |     -     -   171  -166     -     -     -     - |
 KERG |     -  -416  -739  1144     -     -     -     - |
 KIRU |     -    54   297  -345     -     -     -     - |
 KIT3 |     -     -   348  -338     -     -     -     - |
 KOKB |     -  -963  -835  1813     -     -     -     - |
 KOUR |     -  -348   679  -298     -     -     -     - |
 LHAS |     -     -    57   -56     -     -     -     - |
 MAC1 |     -     -   156  -152     -     -     -     - |
 MADR |     -     - -1749  1700     -     -     -     - |
 MAS1 |     -   134   146  -281     -     -     -     - |
 MATE |     -    84   -90     X     -     -     -     - |
 MAW1 |     -     -   221  -215     -     -     -     - |
 MCM4 |     -   289   -14  -286     -     -     -     - |
 MDO1 |     -    50   105  -154     -     -     -     - |
 METS |     -     -   290  -282     -     -     -     - |
 NLIB |     -   108   108  -217     -     -     -     - |
 NRC1 |     -     X   325  -316     -     -     -     - |
 NYAL |     -    91   341  -425     -     -     -     - |
 ONSA |     -   165   120  -288     -     -     -     - |
 PERT |     -   142    52  -198     -     -     -     - |
 PIE1 |     -   117   197  -313     -     -     -     - |
 POTS |     -     -   178  -173     -     -     -     - |
 SANT |     -     - -1743  1695     -     -     -     - |
 SHAO |     -     -   131  -127     -     -     -     - |
 STJO |     -    40   135  -172     -     -     -     - |
 SYOG |     -  -121   129     -     -     -     -     - |
 TIDB |     -  -717  -772  1496     -     -     -     - |
 TOW2 |     -     -   122  -118     -     -     -     - |
 TSKB |     -   -83   193  -101     -     -     -     - |
 VILL |     -   174    90  -268     -     -     -     - |
 WHIT |     -   154     -  -160     -     -     -     - |
 WILL |     -   139   146  -286     -     -     -     - |
 YAR2 |     -  -653  -777  1433     -     -     -     - |
 YELL |     -   133     X  -139     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 | NEPO    RMS
 -----+-------------------------------------------------+-------------
    1 | 69924    52    81   105   654 73290 69902     - |  288  80435
    2 | 82242    24    15    26   590 85984 82240     - |  288  81299
    4 | 68967    28    53    62   418 69891 68970     - |  288  78666
    5 | 81097    17    29    37   465 82658 81093     - |  288  82109
    6 | 85031    64    43    35   635 86238 85019     - |  288  87721
    7 | 80355    35    45    65   764 82065 80225     - |  288  85241
    9 | 80071    27    66    45   374 82035 80039     - |  288  83762
   14 | 85642   132   211   111   588 86701 85744     - |  276  84567
   15 | 16536    30    26    34  1214 19220 16537     - |  288   2687
   16 | 76377    64    54    94   646 78584 76402     - |  277  81160
   17 | 72310    32    40    24   748 73120 72301     - |  288  87431
   18 | 86314    26    40    26   629 88945 86210     - |  288  83390
   19 | 78310    29    37    28   567 79302 78341     - |  287  86667
   20 | 80110    20    45    46   849 81892 80059     - |  288  82642
   21 | 83753   184   155    69   682 84822 83615     - |  276  85271
   22 | 87677    59    25    50  1227 88673 87699     - |  288  80898
   23 | 74067    92   141   177   780 76702 74067     - |  278  76159
   24 | 75608    74    48    37   819 78069 75575     - |  288  82373
   25 | 73497    47    82    38   661 73907 73522     - |  288  77636
   26 | 77155    52    67    31   780 80738 77022     - |  288  76676
   27 | 70708    50    32    74   727 72698 70699     - |  288  76020
   28 |     -   188    80   134  3173 17239     -     - |  288   2122
   29 | 83232    16    42    32   634 84763 83239     - |  288  80759
   31 | 72865    33    47    33   818 73069 72839     - |  288  80071
 -----+-------------------------------------------------+-------------
 ALBH |     -     9    18    15     -     -     -     - |  288  10988
 ALGO |     -     -    13    13     -     -     -     - |  288      7
 BOGT |     -     -   178   173     -     -     -     - |  286  99105
 BRAZ |     -     -    35    34     -     -     -     - |  288  65572
 BRMU |     -     -    23    23     -     -     -     - |  288  93852
 BRUS |     -    22    24    28     -     -     -     - |  217    233
 CAS1 |     -     -    16    16     -     -     -     - |  287   4280
 CEDU |     -     -    16    15     -     -     -     - |  287  69013
 CHUR |     -   146   159   141     -     -     -     - |  267   7422
 DARW |     -    29    19    26     -     -     -     - |  287  56479
 DRAO |     -    17    19    17     -     -     -     - |  288   1131
 FAIR |     -    11    19    16     -     -     -     - |  288     51
 GODE |     -    37    24    31     -     -     -     - |  288  97531
 GRAS |     -     -    21    20     -     -     -     - |  288  54642
 GRAZ |     -    15    30    35     -     -     -     - |  288    679
 GUAM |     -     -    70    69     -     -     -     - |  284    >>>
 HARV |     -     -    38    37     -     -     -     - |  287    >>>
 HERS |     -     -    15    15     -     -     -     - |  288    >>>
 HOB2 |     -     -    14    14     -     -     -     - |  287   1515
 JOZE |     -    19    22    40     -     -     -     - |  286  37458
 KARR |     -     -    12    11     -     -     -     - |  287 107196
 KERG |     -    40    36    37     -     -     -     - |  288 106941
 KIRU |     -    14    26    30     -     -     -     - |  288   9743
 KIT3 |     -     -    19    19     -     -     -     - |  248 140568
 KOKB |     -    35    42    18     -     -     -     - |  288    135
 KOUR |     -    24    32    28     -     -     -     - |  288   2540
 LHAS |     -     -    27    26     -     -     -     - |  288  80579
 MAC1 |     -     -    28    28     -     -     -     - |  287  37040
 MADR |     -     -    24    23     -     -     -     - |  282     93
 MAS1 |     -    18    30    31     -     -     -     - |  288   5965
 MATE |     -    18    19     X     -     -     -     - |  288     98
 MAW1 |     -     -   134   130     -     -     -     - |  177  38232
 MCM4 |     -    31    21    19     -     -     -     - |  288  71032
 MDO1 |     -    13    32    31     -     -     -     - |  287    546
 METS |     -     -    36    35     -     -     -     - |  288    441
 NLIB |     -    30    52    36     -     -     -     - |  288     66
 NRC1 |     -     X   116   113     -     -     -     - |  254    519
 NYAL |     -    35    18    42     -     -     -     - |  288    126
 ONSA |     -    12    23    24     -     -     -     - |  288     52
 PERT |     -    18    13    15     -     -     -     - |  288   2411
 PIE1 |     -    16    24    14     -     -     -     - |  288    135
 POTS |     -     -    20    20     -     -     -     - |  288  83984
 SANT |     -     -    35    34     -     -     -     - |  288     47
 SHAO |     -     -    23    23     -     -     -     - |  287  78234
 STJO |     -    33    39    63     -     -     -     - |  288    >>>
 SYOG |     -    28    30     -     -     -     -     - |  282    >>>
 TIDB |     -    24    24    12     -     -     -     - |  282     48
 TOW2 |     -     -    24    24     -     -     -     - |  287  75309
 TSKB |     -    16    26    26     -     -     -     - |  288   1938
 VILL |     -    17    33    39     -     -     -     - |  288   3437
 WHIT |     -    68     -    70     -     -     -     - |  288  79738
 WILL |     -    14    16    14     -     -     -     - |  288   6124
 YAR2 |     -    18    20    18     -     -     -     - |  288   1352
 YELL |     -   130     X   135     -     -     -     - |  277    142
 -----+-------------------------------------------------+-------------
 TOT  | 76537    58    58    57   965 76702 76514     - |
