
 cls-file Version 2.0
 GPS week: 0809   Day: 6   MJD: 49913                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2185      0    1325   -7926  74509  74509      0  76566  76566      0    0.00
 em1 |   288     0  15916    802 -999999  -32920     65     84     47    474    361    539   27.37
 es1 |   288     0  21658    314   -1760  -17610     60     79     48    747    695    770   29.79
 gf1 |   281     0  21315    304   -5758  -11812     40     52     32    593    381    665   42.84
 igf |    96     0   2278      1    1255   -8094    920    920      0   1291   1291      0    0.00
 ng1 |    96     0   2282      0   -4976  -12985  74926  74926      0  77638  77638      0    0.00
 pd1 |    96     0   2186      0    1494   -8276  74519  74519      0  76559  76559      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 |
 -----+-------------------------------------------------+
    1 |  -492   226    25  -166   683 16617  -457     - |
    2 |  -862   535  -558    50 -1116 -9301  -791     - |
    4 |  1010  -424  1125  -524   551 17586   834     - |
    5 |  -420   445  -336   -45   877 -2881  -358     - |
    6 |  -436   -20   454  -311  -206 -8816  -467     - |
    7 |  1302   331  -605   215   695 -4560  1410     - |
    9 |   457    64   439  -355   468  5696   745     - |
   14 |  -163    -2   517  -367  -959  7057  -194     - |
   15 |  -158   239  -704   346   -12 14019  -144     - |
   16 |  -245   331  -367    45   -78  4891  -478     - |
   17 |  1222   335  -554   177    17 17638   895     - |
   18 | -1454   221   244  -318   179-14197 -1176     - |
   19 | -1982  -131   210   -64 -1981   538 -1660     - |
   20 | -1187     X   174  -121   363-13430 -1084     - |
   21 |  -397    39   -64    20  -904-19281  -537     - |
   22 |   193     X  -600   417  1319-15806   -36     - |
   23 |  -112   269  -247     -  -407-13212  1058     - |
   24 | -1000  -297   340   -48  -276  9834  -952     - |
   25 |  1363  -266   680  -307   401 -4123   609     - |
   26 |   699  -365  1175  -598  -527 11526   524     - |
   27 | -1306   139   155  -201  -587 -2110 -1391     - |
   28 |     -   353   746  -682  -353 10390     -     - |
   29 |   761  -127   698  -414   385 -9748   624     - |
   31 |  3180   293  -251   -13  1593  -858  2877     - |
 -----+-------------------------------------------------+
 ALBH |     -    47   298  -243     -     -     -     - |
 ALGO |     -     -   311  -216     -     -     -     - |
 ALIC |     -     -   174  -121     -     -     -     - |
 AREQ |     -   163   144  -209     -     -     -     - |
 BOGT |     -     -  -165   115     -     -     -     - |
 BRAZ |     -     -   281  -195     -     -     -     - |
 BRMU |     -     -   221  -154     -     -     -     - |
 BRUS |     -    -8   226  -156     -     -     -     - |
 CEDU |     -     -   142   -99     -     -     -     - |
 CHUR |     -   293     X  -187     -     -     -     - |
 DARW |     -    27   239  -188     -     -     -     - |
 DRAO |     -   241   205  -305     -     -     -     - |
 FAIR |     -  -922 -1128  1408     -     -     -     - |
 GODE |     -   202   140  -232     -     -     -     - |
 GRAS |     -     -   239  -166     -     -     -     - |
 GRAZ |     -  -790  -793  1090     -     -     -     - |
 HARV |     -     -   224  -156     -     -     -     - |
 HERS |     -     -  -649   451     -     -     -     - |
 HOB2 |     -     -    51   -35     -     -     -     - |
 JOZE |     -   106   217  -224     -     -     -     - |
 JPLM |     -     -   204  -142     -     -     -     - |
 KARR |     -     -   228  -159     -     -     -     - |
 KERG |     -  -582 -1144  1197     -     -     -     - |
 KIRU |     -   121   305  -297     -     -     -     - |
 KIT3 |     -     -  2242 -1560     -     -     -     - |
 KOKB |     - -1422 -1266  1833     -     -     -     - |
 KOSG |     -     - -1735  1207     -     -     -     - |
 KOUR |     -    76   371  -314     -     -     -     - |
 LHAS |     -     -   136   -94     -     -     -     - |
 MAC1 |     -     -   171  -119     -     -     -     - |
 MAS1 |     -   224   158  -259     -     -     -     - |
 MATE |     -   151  -139     X     -     -     -     - |
 MCM4 |     -   396   -51  -224     -     -     -     - |
 MDO1 |     -   259   137  -267     -     -     -     - |
 METS |     -     -   283  -197     -     -     -     - |
 NLIB |     -   235    90  -218     -     -     -     - |
 NRC1 |     -     X   275  -191     -     -     -     - |
 NYAL |     - -1078  -949  1378     -     -     -     - |
 ONSA |     -   110   143  -174     -     -     -     - |
 PIE1 |     -   139   272  -285     -     -     -     - |
 POL2 |     -     -    52   -36     -     -     -     - |
 POTS |     -     -   132   -92     -     -     -     - |
 SANT |     -     - -1987  1382     -     -     -     - |
 SHAO |     -     -   204  -142     -     -     -     - |
 STJO |     -   190   131  -218     -     -     -     - |
 TIDB |     -  -784  -976  1210     -     -     -     - |
 TSKB |     -    25   224  -176     -     -     -     - |
 USUD |     -   157   135  -199     -     -     -     - |
 VILL |     -   371  -107  -166     -     -     -     - |
 WES2 |     -     -   112   -78     -     -     -     - |
 WHIT |     -   319     -  -204     -     -     -     - |
 WILL |     -   276   164  -298     -     -     -     - |
 YAR2 |     -  -849 -1051  1306     -     -     -     - |
 YELL |     -   193   244  -290     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 | NEPO    RMS
 -----+-------------------------------------------------+-------------
    1 | 79797    45    60    38   527 81216 79835     - |  288  76452
    2 | 74320    44    80    58   965 76966 74290     - |  277  79590
    4 | 83875    42    31    29   626 85102 83866     - |  288  80458
    5 | 81162   228   179    41   451 82641 81122     - |  278  83109
    6 | 79721    50    46    30   564 80099 79751     - |  288  81578
    7 | 70182    44    40    21   688 71533 70165     - |  288  78033
    9 | 71561    43   122    76   632 75546 71581     - |  288  77855
   14 | 85470    30    43    35   576 86253 85468     - |  288  85201
   15 | 17806    62    60    30   945 17988 17737     - |  288   2829
   16 | 63514    41    89    55   883 68928 63577     - |  288  82869
   17 | 72243    41    97    66   864 75672 72119     - |  286  82037
   18 | 71067    83    25    44   742 74278 71004     - |  288  78985
   19 | 74407   101    73    22   744 75869 74451     - |  288  84460
   20 | 87924     X    85    59   668 89382 87860     - |  270  82582
   21 | 72638    57    42    52  1085 73993 72587     - |  288  79008
   22 | 87468     X   126    88   671 90110 87509     - |  269  82756
   23 | 74639   129   119     -  1578 76508 75335     - |  282  87958
   24 | 72110    77    56    75   689 73198 72010     - |  288  76816
   25 | 71815    49    33    32   569 74430 71750     - |  288  80733
   26 | 74789    94   104    26  1215 75387 74782     - |  288  79984
   27 | 77564    25    25    22  1162 78835 77557     - |  288  87153
   28 |     -   142    87    79  2188 17390     -     - |  287   2268
   29 | 77828    59    19    40   579 79565 77814     - |  288  81081
   31 | 75434   116    54    95   647 79346 75330     - |  288  78650
 -----+-------------------------------------------------+-------------
 ALBH |     -    23    23    16     -     -     -     - |  288  12508
 ALGO |     -     -    89    62     -     -     -     - |  281    204
 ALIC |     -     -    40    27     -     -     -     - |  280    >>>
 AREQ |     -   103    43    41     -     -     -     - |  288 119449
 BOGT |     -     -   112    78     -     -     -     - |  156  83801
 BRAZ |     -     -    23    16     -     -     -     - |  281  88088
 BRMU |     -     -    34    24     -     -     -     - |  279 110228
 BRUS |     -    43    36    27     -     -     -     - |  288    317
 CEDU |     -     -    43    30     -     -     -     - |  280  68225
 CHUR |     -   100     X    64     -     -     -     - |  221   3853
 DARW |     -    35    45    23     -     -     -     - |  287  59411
 DRAO |     -    31    27    13     -     -     -     - |  288    421
 FAIR |     -    25    34    23     -     -     -     - |  288    297
 GODE |     -    38    33    32     -     -     -     - |  288    493
 GRAS |     -     -    23    16     -     -     -     - |  281  42443
 GRAZ |     -    54    44    21     -     -     -     - |  288    503
 HARV |     -     -    24    17     -     -     -     - |  281    >>>
 HERS |     -     -    24    17     -     -     -     - |  280 148664
 HOB2 |     -     -    25    17     -     -     -     - |  280  65733
 JOZE |     -    53    30    29     -     -     -     - |  287  35046
 JPLM |     -     -    26    18     -     -     -     - |  281  61558
 KARR |     -     -    31    22     -     -     -     - |  280  88201
 KERG |     -    57    52    30     -     -     -     - |  288 156833
 KIRU |     -    47    23    23     -     -     -     - |  288   1524
 KIT3 |     -     -    43    30     -     -     -     - |  270 179350
 KOKB |     -    33    42    29     -     -     -     - |  288    352
 KOSG |     -     -    21    15     -     -     -     - |  280    979
 KOUR |     -    38    43    17     -     -     -     - |  288   2875
 LHAS |     -     -    55    38     -     -     -     - |  277  91404
 MAC1 |     -     -    60    42     -     -     -     - |  279  60498
 MAS1 |     -    37    35    13     -     -     -     - |  288   6551
 MATE |     -    49    45     X     -     -     -     - |  287    307
 MCM4 |     -    34    29    32     -     -     -     - |  288  76833
 MDO1 |     -    39    34    17     -     -     -     - |  288   1342
 METS |     -     -    23    16     -     -     -     - |  281    566
 NLIB |     -    35    29    21     -     -     -     - |  288    278
 NRC1 |     -     X   143    99     -     -     -     - |  232    621
 NYAL |     -    47    24    28     -     -     -     - |  287    445
 ONSA |     -    51    36    25     -     -     -     - |  288    380
 PIE1 |     -    43    25    24     -     -     -     - |  288    124
 POL2 |     -     -   146   102     -     -     -     - |  275 160209
 POTS |     -     -    26    18     -     -     -     - |  281  92051
 SANT |     -     -    20    14     -     -     -     - |  281    248
 SHAO |     -     -    18    13     -     -     -     - |  281    397
 STJO |     -    46    36    19     -     -     -     - |  288  19858
 TIDB |     -    31    27    22     -     -     -     - |  287    256
 TSKB |     -    39    40    21     -     -     -     - |  288   1182
 USUD |     -    29    51    30     -     -     -     - |  288   1088
 VILL |     -    50    28    24     -     -     -     - |  288   1699
 WES2 |     -     -    48    34     -     -     -     - |  281    599
 WHIT |     -    20     -    13     -     -     -     - |  281  77268
 WILL |     -    24    26    11     -     -     -     - |  288   1523
 YAR2 |     -    40    45    24     -     -     -     - |  288   1986
 YELL |     -    80   109    30     -     -     -     - |  286    516
 -----+-------------------------------------------------+-------------
 TOT  | 74510    65    60    40   920 74927 74519     - |
