
 cls-file Version 2.0
 GPS week: 0809   Day: 3   MJD: 49910                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2001      0     564   -4212  75197  75197      0  77134  77134      0    0.00
 em1 |   288     0  14730    784 -999999  -24385     59     67     53    378    363    387   30.81
 es1 |   288     0  21233     37   -7524   -7709     48     51     47    493    505    488   37.59
 gf1 |   288     0  20973    411   -4106   -4804     56     70     49    687    408    778   31.60
 igf |    96     0   2097      4     619   -4539    496    496      0    878    878      0    0.00
 ng1 |    96     0   2097      0   -3599   -1126  76658  76658      0  78810  78810      0    0.00
 pd1 |    96     0   2001      0     648   -4218  75176  75176      0  77111  77111      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 |
 -----+-------------------------------------------------+
    1 |  -333   143    20  -170   788  -419   311     - |
    2 |   910   512  -545   144  -475  6651   797     - |
    4 |  -160  -519  1022  -709  -186 -2111   -34     - |
    5 | -1449     X  -140   166   138  1494  -870     - |
    6 |  -409  -218   474  -351  -969 -2799  -307     - |
    7 | -1314   346  -574   343   639  4446  -806     - |
    9 |  -156   -84   391  -382  -210  -147  -359     - |
   14 | -1547   -15   456  -528  -849  3079 -1128     - |
   15 |   468   437  -672   313   516  5951   338     - |
   16 |   446   287  -390   184   507 21646   137     - |
   17 |   452   304  -387   165  -240  9571    97     - |
   18 |    54   180   179  -389    64 -2529  -514     - |
   19 |    87   -28   138  -138 -1857 -6943    25     - |
   20 |  2546     X   130  -154  -100 -8316  2266     - |
   21 |  -713   -17   -19    38  -128  -241  -764     - |
   22 |  2172   950  -796   216   608 -3267  1834     - |
   24 |  -756  -355   370   -95  -321  1574 -1140     - |
   25 |  -850  -330   616  -411   165-16609  -714     - |
   27 | -1199   148    43  -196  -538 -4400  -792     - |
   28 |     -   237   761 -1136  1137  3356     -     - |
   29 |   290  -272   666  -527  -156 -4427   265     - |
   31 |  1751   306  -270    23  1441 -5399  1631     - |
 -----+-------------------------------------------------+
 ALBH |     -   100   175  -306     -     -     -     - |
 ALGO |     -     -   209  -248     -     -     -     - |
 ALIC |     -     -   165  -196     -     -     -     - |
 AREQ |     -   144   116  -278     -     -     -     - |
 BOGT |     -     -  -586   697     -     -     -     - |
 BRAZ |     -     -   173  -205     -     -     -     - |
 BRMU |     -     -   140  -166     -     -     -     - |
 BRUS |     -    54   223  -319     -     -     -     - |
 CAS1 |     -     -   183  -218     -     -     -     - |
 CHUR |     -   118   350  -532     -     -     -     - |
 DARW |     -     6   195  -234     -     -     -     - |
 DRAO |     -   178   170  -376     -     -     -     - |
 FAIR |     - -1171 -1165  2557     -     -     -     - |
 GODE |     -    56   121  -198     -     -     -     - |
 GRAS |     -     -   224  -267     -     -     -     - |
 GRAZ |     -  -283  -762  1345     -     -     -     - |
 HARV |     -     -    85  -101     -     -     -     - |
 HERS |     -     -  -552   657     -     -     -     - |
 HOB2 |     -     -    74   -88     -     -     -     - |
 JOZE |     -    54   191  -280     -     -     -     - |
 JPLM |     -     -   136  -161     -     -     -     - |
 KARR |     -     -   179  -213     -     -     -     - |
 KERG |     -  -383  -893  1436     -     -     -     - |
 KIRU |     -    59   289  -402     -     -     -     - |
 KIT3 |     -     -  1016 -1209     -     -     -     - |
 KOKB |     - -1154  -917  2216     -     -     -     - |
 KOSG |     -     - -1477  1757     -     -     -     - |
 KOUR |     -   -68   457  -473     -     -     -     - |
 LHAS |     -     -    96  -114     -     -     -     - |
 MAC1 |     -     -   105  -125     -     -     -     - |
 MADR |     -     - -1589  1891     -     -     -     - |
 MAS1 |     -   337    79  -418     -     -     -     - |
 MATE |     -   187  -153     X     -     -     -     - |
 MAW1 |     -     -    95  -113     -     -     -     - |
 MCM4 |     -   329   -38  -276     -     -     -     - |
 MDO1 |     -    47   109  -175     -     -     -     - |
 METS |     -     -   234  -278     -     -     -     - |
 NLIB |     -   139    55  -200     -     -     -     - |
 NRC1 |     -     X   231  -275     -     -     -     - |
 ONSA |     -    92   188  -308     -     -     -     - |
 PIE1 |     -    41   249  -335     -     -     -     - |
 POTS |     -     -   199  -236     -     -     -     - |
 SHAO |     -     -   171  -204     -     -     -     - |
 STJO |     -    70   135  -229     -     -     -     - |
 TIDB |     -  -232  -384   860     -     -     -     - |
 TOW2 |     -     -   155  -184     -     -     -     - |
 TSKB |     -  -247   202     -     -     -     -     - |
 USUD |     -    63   155  -246     -     -     -     - |
 VILL |     -   157    45  -207     -     -     -     - |
 WES2 |     -     -   142  -168     -     -     -     - |
 WILL |     -   231    92  -334     -     -     -     - |
 YAR2 |     -  -756  -711  1583     -     -     -     - |
 YELL |     -    32   236  -311     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 | NEPO    RMS
 -----+-------------------------------------------------+-------------
    1 | 73055   107    36   133   697 77296 72943     - |  288  76774
    2 | 84664    52    75    68   346 86514 84629     - |  276  83456
    4 | 72002    43    18    54   218 73879 72008     - |  288  80605
    5 | 76674     X    44    52   527 78490 76643     - |  277  79542
    6 | 76035    35    19    37   539 78692 76056     - |  288  83466
    7 | 81691    65    30    49   346 84724 81508     - |  288  86614
    9 | 73086    58    73    52   448 78224 73078     - |  288  84357
   14 | 73897    31    41    42   322 76520 73863     - |  288  79257
   15 | 17289    80    66    58   266 17375 17279     - |  278   3515
   16 | 80865    89    54    39   472 81595 80867     - |  288  86023
   17 | 76883    40    65    70   993 87958 76812     - |  288  89873
   18 | 86606    46    23    26   505 87758 86620     - |  288  81316
   19 | 75671    47    55    50   261 77458 75637     - |  288  75838
   20 | 78053     X    65    78   339 79488 78119     - |  277  78610
   21 | 70400    58    32    32   478 78105 70413     - |  288  80505
   22 | 77908   127   108   151   591 82009 77901     - |  272  86495
   24 | 82210    39    37    36   464 87199 82249     - |  288  82403
   25 | 80460    29    30    55   484 85249 80435     - |  288  81078
   27 | 68569    39    42    82   302 70886 68535     - |  288  81043
   28 |     -   134    23   137   740 16972     -     - |  288   2133
   29 | 78621    28    53    50   462 79823 78618     - |  288  75347
   31 | 77519    81    43    34   501 78654 77509     - |  288  79722
 -----+-------------------------------------------------+-------------
 ALBH |     -    35    19    50     -     -     -     - |  288  22679
 ALGO |     -     -    16    19     -     -     -     - |  287     63
 ALIC |     -     -    27    32     -     -     -     - |  284  40892
 AREQ |     -    70    50    25     -     -     -     - |  288 118736
 BOGT |     -     -    35    41     -     -     -     - |  288 104151
 BRAZ |     -     -    33    40     -     -     -     - |  287  74362
 BRMU |     -     -    28    34     -     -     -     - |  284  98219
 BRUS |     -    15    40    50     -     -     -     - |  288     87
 CAS1 |     -     -    21    25     -     -     -     - |  280   4581
 CHUR |     -   168   113   131     -     -     -     - |  278   8966
 DARW |     -    28    24    31     -     -     -     - |  287  52853
 DRAO |     -    15    20    26     -     -     -     - |  288    890
 FAIR |     -    22    19    30     -     -     -     - |  279    126
 GODE |     -   101    46    48     -     -     -     - |  288    530
 GRAS |     -     -    24    29     -     -     -     - |  288  37774
 GRAZ |     -    27    37    57     -     -     -     - |  288    649
 HARV |     -     -    28    34     -     -     -     - |  287    >>>
 HERS |     -     -    39    46     -     -     -     - |  287 179269
 HOB2 |     -     -    49    59     -     -     -     - |  277    >>>
 JOZE |     -    19    22    24     -     -     -     - |  286  18836
 JPLM |     -     -    37    44     -     -     -     - |  288  84407
 KARR |     -     -    21    25     -     -     -     - |  286  59243
 KERG |     -    24    22    19     -     -     -     - |  288 125887
 KIRU |     -    12    39    44     -     -     -     - |  288   2029
 KIT3 |     -     -    31    37     -     -     -     - |  245 159037
 KOKB |     -    42    26    42     -     -     -     - |  288    144
 KOSG |     -     -    20    24     -     -     -     - |  287  10250
 KOUR |     -    51    43    26     -     -     -     - |  288   1351
 LHAS |     -     -    21    25     -     -     -     - |  277 102065
 MAC1 |     -     -    49    58     -     -     -     - |  287  40129
 MADR |     -     -    39    46     -     -     -     - |  287    100
 MAS1 |     -    35    54    42     -     -     -     - |  288   6459
 MATE |     -    22    18     X     -     -     -     - |  288    159
 MAW1 |     -     -    11    13     -     -     -     - |  285  35983
 MCM4 |     -    31    12    32     -     -     -     - |  287  74376
 MDO1 |     -    20    22    22     -     -     -     - |  288    688
 METS |     -     -    21    25     -     -     -     - |  288    243
 NLIB |     -    13    30    37     -     -     -     - |  288    108
 NRC1 |     -     X   169   201     -     -     -     - |  165    580
 ONSA |     -    75    39    38     -     -     -     - |  262 210588
 PIE1 |     -    20    24    27     -     -     -     - |  288     98
 POTS |     -     -    40    48     -     -     -     - |  288  79760
 SHAO |     -     -    22    26     -     -     -     - |  287    248
 STJO |     -    24    24    23     -     -     -     - |  288  29637
 TIDB |     -    89    58    55     -     -     -     - |  286    117
 TOW2 |     -     -    21    25     -     -     -     - |  285  62939
 TSKB |     -    51    42     -     -     -     -     - |  288   1169
 USUD |     -    65    60    28     -     -     -     - |  288    568
 VILL |     -    88   196   150     -     -     -     - |  284 543087
 WES2 |     -     -    12    14     -     -     -     - |  288    100
 WILL |     -    15    16    26     -     -     -     - |  288    919
 YAR2 |     -    23    27    29     -     -     -     - |  288   1140
 YELL |     -    15    18    28     -     -     -     - |  288   2194
 -----+-------------------------------------------------+-------------
 TOT  | 75197    60    49    57   497 76658 75177     - |
