
 cls-file Version 2.0
 GPS week: 0804   Day: 0   MJD: 49872                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2190      0    -986    -756  77324  77324      0  79053  79053      0    0.00
 em1 |   288     0  15583     12  408910    4171     57     63     52    271    286    261   35.34
 es1 |   288     0  20992    856   -9629    3825     56     77     41    453    510    421   34.67
 gf1 |   288     0  20686    839   -7404   -7829     66     86     52    578    454    634   30.00
 igf |    96     0   2285      0    -924    -401    522    522      0   1020   1020      0    0.00
 ng1 |    96     0   2286      0   -1862  -12584  77480  77480      0  79558  79558      0    0.00
 pd1 |    96     0   2190      0    -983    -763  77317  77317      0  79046  79046      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 |
 -----+-------------------------------------------------+
    1 |  1211   144   -30  -136   682-17041   912     - |
    2 |   535   422  -512    97  -254  3752   815     - |
    4 |  -280     -   740  -855  -367 -1238   300     - |
    5 |   904   185  -201    14   -76 -1076   673     - |
    6 | -1834  -139   413  -314 -1234  4771 -2194     - |
    7 |  1745   262  -512   283  1175 -8248  1470     - |
    9 | -1092   -55   353  -344  -491  3729  -918     - |
   14 |   424   -86   470  -443  -611-10464   142     - |
   15 |   737   300  -647   359   511  9456   746     - |
   16 |   196   181  -381   227   372   352   353     - |
   17 | -2965   232  -605   320   382 12367 -2408     - |
   18 |   286   143   233  -438   157-18788   196     - |
   19 | -2069   -96   147   -57 -1707  1266 -2093     - |
   20 | -1122    66    88  -180  -749 -4214 -1185     - |
   21 |   253   -64   -39   122   -47 20958   327     - |
   22 |   219   718  -934   234   693 -4296   329     - |
   23 |  -186   119  -198    89  -330  6095   -68     - |
   24 |   964     -   187  -217  -673 -4434  1193     - |
   25 |    -8  -228   516  -330   158 -3785   120     - |
   26 |  -577  -366  1022  -750  -336 -3114 -1181     - |
   27 |   -74    54    73  -147  -527 10245   -11     - |
   28 |     -   281   665 -1130  1544  6544     -     - |
   29 |   258  -303   679  -428     1 -6527  -178     - |
   31 |  2070   356  -311   -60  1677  4188  2311     - |
 -----+-------------------------------------------------+
 ALBH |     -    77    70  -172     -     -     -     - |
 ALGO |     -   -17   209  -222     -     -     -     - |
 AREQ |     -   163    75  -278     -     -     -     - |
 BOGT |     -     -  -526   608     -     -     -     - |
 BRMU |     -     -    96  -111     -     -     -     - |
 BRUS |     -     2   159  -186     -     -     -     - |
 CAS1 |     -     -   171  -198     -     -     -     - |
 CEDU |     -     -   168  -195     -     -     -     - |
 CHUR |     -   279     X  -329     -     -     -     - |
 DARW |     -    77   113  -221     -     -     -     - |
 DRAO |     -   -20   218  -229     -     -     -     - |
 FAIR |     -   -15    16     X     -     -     -     - |
 GODE |     -   -39   139  -115     -     -     -     - |
 GOLD |     -     -   -63    73     -     -     -     - |
 GRAS |     -     -   171  -198     -     -     -     - |
 GRAZ |     -  -210   214     X     -     -     -     - |
 GUAM |     -     -    77   -89     -     -     -     - |
 HARV |     -     -   136  -157     -     -     -     - |
 HERS |     -     -  -384   444     -     -     -     - |
 HOB2 |     -    85    82  -195     -     -     -     - |
 JOZE |     -   -29   161  -152     -     -     -     - |
 JPLM |     -     -   107  -123     -     -     -     - |
 KARR |     -     -   190  -220     -     -     -     - |
 KERG |     -  -455  -651  1289     -     -     -     - |
 KIRU |     -   -41   295  -292     -     -     -     - |
 KOKB |     -  -796  -667  1907     -     -     -     - |
 KOSG |     -     - -1435  1659     -     -     -     - |
 KOUR |     -  -291   564  -309     -     -     -     - |
 LHAS |     -     -    -3     4     -     -     -     - |
 MADR |     -     - -1613  1864     -     -     -     - |
 MAS1 |     -   -43   183  -162     -     -     -     - |
 MATE |     -  -117   119     X     -     -     -     - |
 MCM4 |     -   292   -67  -266     -     -     -     - |
 MDO1 |     -   160    65  -264     -     -     -     - |
 METS |     -     -   150  -174     -     -     -     - |
 NLIB |     -     -   155  -180     -     -     -     - |
 NRC1 |     -   105     X  -123     -     -     -     - |
 NYAL |     -    80     X   -94     -     -     -     - |
 ONSA |     -   -19   203  -213     -     -     -     - |
 PIE1 |     -   -41    41     -     -     -     -     - |
 STJO |     -  -107   167   -67     -     -     -     - |
 TIDB |     -  -513  -612  1311     -     -     -     - |
 TOW2 |     -     -   141  -163     -     -     -     - |
 TSKB |     -    -4    93  -103     -     -     -     - |
 USUD |     -    14    92  -124     -     -     -     - |
 VILL |     -    35   -50    17     -     -     -     - |
 WES2 |     -  -154   211   -61     -     -     -     - |
 WILL |     -    -5   158  -176     -     -     -     - |
 YAR2 |     -  -605  -651  1475     -     -     -     - |
 YELL |     -   -84   219  -151     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 | NEPO    RMS
 -----+-------------------------------------------------+-------------
    1 | 75000    76    32   109   335 77474 74968     - |  288  86781
    2 | 70858    30    75   108   910 73280 70869     - |  287  78210
    4 | 73006     -    57    66   217 75612 73016     - |  277  80564
    5 | 76357    30    28    21   325 77839 76303     - |  288  82210
    6 | 80154    58    42   108   429 81646 80222     - |  288  84182
    7 | 87738    33    41    32   477 89138 87710     - |  288  82536
    9 | 88263    59    72    46   366 92735 88244     - |  288  81523
   14 | 78735    30    83    99   252 79709 78671     - |  288  80262
   15 | 16383   178   174    88   527 16116 16388     - |  274   3451
   16 | 80959    46    39    49   247 82587 80957     - |  288  84553
   17 | 74514    80   143   131   605 77497 74354     - |  276  81301
   18 | 83268    20    34    28   382 87104 83266     - |  288  83804
   19 | 70377    31   102   126   331 72353 70378     - |  288  82978
   20 | 65073   110   105    65   690 65897 65088     - |  287  81173
   21 | 92105    94    31   106   831 94812 92113     - |  288  93898
   22 | 82254    41    63    97   526 82970 82245     - |  288  84271
   23 | 88516    32    48    78   630 88825 88523     - |  288  83517
   24 | 75097     -   136   157   568 76837 75056     - |  273  80530
   25 | 83003    40   108   122   421 83657 83000     - |  288  82417
   26 | 76957    51    35    39   418 78027 77034     - |  288  82279
   27 | 74642    31    31    23   711 75399 74653     - |  288  81524
   28 |     -    53    89    86   561 16790     -     - |  288   2413
   29 | 79957    36    28    29   615 81106 79947     - |  288  81339
   31 | 81760    26    57    68   493 83714 81791     - |  288  84654
 -----+-------------------------------------------------+-------------
 ALBH |     -    31    29    35     -     -     -     - |  288  17053
 ALGO |     -    47    24    37     -     -     -     - |  288    179
 AREQ |     -    83    46    47     -     -     -     - |  232    >>>
 BOGT |     -     -    17    20     -     -     -     - |  288 123473
 BRMU |     -     -    27    32     -     -     -     - |  287 110621
 BRUS |     -    29    31    19     -     -     -     - |  288    100
 CAS1 |     -     -    20    23     -     -     -     - |  287   7007
 CEDU |     -     -    19    22     -     -     -     - |  287  44689
 CHUR |     -   101     X   119     -     -     -     - |  247   1191
 DARW |     -    30    18    30     -     -     -     - |  287  56011
 DRAO |     -    16    29    39     -     -     -     - |  288    711
 FAIR |     -    45    46     X     -     -     -     - |  286     45
 GODE |     -    20    22    28     -     -     -     - |  288    264
 GOLD |     -     -    75    87     -     -     -     - |  287    193
 GRAS |     -     -    20    23     -     -     -     - |  288    >>>
 GRAZ |     -    39    40     X     -     -     -     - |  217 292500
 GUAM |     -     -    24    28     -     -     -     - |  286 103523
 HARV |     -     -    19    22     -     -     -     - |  288    >>>
 HERS |     -     -    23    26     -     -     -     - |  288  89573
 HOB2 |     -    56    48    34     -     -     -     - |  287    843
 JOZE |     -    17    36    30     -     -     -     - |  286  25606
 JPLM |     -     -    27    31     -     -     -     - |  288  77123
 KARR |     -     -    18    21     -     -     -     - |  287  99090
 KERG |     -    31    34    30     -     -     -     - |  288 102327
 KIRU |     -    25    27    21     -     -     -     - |  288   2294
 KOKB |     -    45    51    96     -     -     -     - |  288     37
 KOSG |     -     -    21    24     -     -     -     - |  287    970
 KOUR |     -    16    21    25     -     -     -     - |  288   2375
 LHAS |     -     -    29    34     -     -     -     - |  284  90857
 MADR |     -     -    26    31     -     -     -     - |  269     93
 MAS1 |     -    30    32    15     -     -     -     - |  288   6265
 MATE |     -    23    23     X     -     -     -     - |  288     82
 MCM4 |     -    36    27    29     -     -     -     - |  288  91615
 MDO1 |     -    56    22    55     -     -     -     - |  288    874
 METS |     -     -   158   182     -     -     -     - |  288  22131
 NLIB |     -     -    18    21     -     -     -     - |  288     77
 NRC1 |     -   118     X   139     -     -     -     - |  267    947
 NYAL |     -    20     X    24     -     -     -     - |  288     89
 ONSA |     -    25    33    22     -     -     -     - |  288     90
 PIE1 |     -    22    23     -     -     -     -     - |  288     92
 STJO |     -    49    38    34     -     -     -     - |  288   4733
 TIDB |     -    41    25    42     -     -     -     - |  288     70
 TOW2 |     -     -    19    22     -     -     -     - |  287  88774
 TSKB |     -    37    39    36     -     -     -     - |  288   1102
 USUD |     -    30    31    36     -     -     -     - |  288   1447
 VILL |     -    22    31    21     -     -     -     - |  288   2575
 WES2 |     -    51    41    40     -     -     -     - |  288     70
 WILL |     -    18    19    26     -     -     -     - |  288   3511
 YAR2 |     -    32    22    36     -     -     -     - |  288   1801
 YELL |     -   181   110   105     -     -     -     - |  256    550
 -----+-------------------------------------------------+-------------
 TOT  | 77325    57    56    66   522 77480 77317     - |
